TWELFTH-NIGHT; OR, WHAT YOU WILL

Shakespeare

Published by Liberty Fund, Inc.

Liberty Fund, Inc.

Liberty Fund, Inc. is a private, educational foundation established to encourage the study of the ideal of a society of free and responsible individuals. It was founded in 1960 thus making 2010 its 50th Anniversary Year.

The Foundation develops, supervises, and finances its own educational activities to foster thought and encourage discourse on enduring intellectual issues pertaining to liberty. This is done through the implementation of different programs:

1. Each year, Liberty Fund conducts over 150 conferences throughout the United States, Canada, Latin America, and Europe.

2. Liberty Fund publishes about 10 books each year, many of which are classic works which have gone out of print. There is an online catalog where these books can be ordered <http://www.libertyfund.org/books.aspx>.

3. Liberty Fund has produced video and audio tapes including The Intellectual Portrait Series of videotapes and DVDs which records conversations with some of the most significant thinkers of our time.

4. Liberty Fund hosts two websites which contain books, articles, discussion, and podcasts about liberty: the Library of Economics and Liberty <http://www.econlib.org/> and the Online Library of Liberty <http://oll.libertyfund.org/>.

These programs focus on the place individual liberty has in an intellectual heritage evident from ancient times and continuing through our own times. The programs are intended to enrich understanding and appreciation of the complex nature of a society of free and responsible individuals and to contribute to its preservation.

Liberty Fund also sponsors the following websites:

1. Liberty Fund’s main website <http://www.libertyfund.org>

2. LF online catalog <http://www.libertyfund.org/books.aspx>

3. The Goodrich Seminar Room Virtual Tour <http://goodrich.libertyfund.org/goodrich/>

4. The Online Library of Liberty <http://oll.libertyfund.org/>

5. Library of Economics and Liberty <http://www.econlib.org/>

As a tax-exempt, private operating foundation, Liberty Fund’s purposes are educational. It does not, therefore, engage in political action of any kind. It fulfills its mission by conducting programs, not by awarding grants to outside organizations or individuals.

The cuneiform inscription that appears in the logo and serves as a design element in all Liberty Fund books and websites is the earliest-known written appearance of the word “freedom” (amagi), or “liberty.” It is taken from a clay document written about 2300 B.C. in the Sumerian city-state of Lagash.

LIBERTY FUND, INC.

8335 Allison Pointe Trail, Suite 300

Indianapolis, Indiana 46250-1684

U.S.A.

Phone no.: 1.800.955.8335

Liberty Fund’s Collection of Epub Titles on Liberty

The text you are currently reading comes from Liberty Fund’s Online Library of Liberty (OLL) <http://oll.libertyfund.org>. Additional titles in ePub format can be downloaded from the main OLL website from each title’s Table of Contents page or from this list <http://files.libertyfund.org/output/epub/>. One convenient way to load titles directly into your iPad is to email yourself this link, click on the title of your choice, and open it directly in iBook on your iPad (thus circumventing the need to load titles from your laptop or desktop computer.

Epub and Kindle versions of books published by Liberty Fund are not available for free download. They can be purchased from Amazon.com.

The Online Library of Liberty

The OLL was established in 2004 in order to further the educational goals of Liberty Fund, Inc, namely “to encourage study of the ideal of a society of free and responsible individuals”. It is a multi-award winning website which makes available at no charge to the public outstanding resources for teaching and learning about the humanities and the social sciences.

Awards

The OLL has won a number of international awards for its outstanding collection of online material in the humanities and social sciences. It has been recognised by

- the Library of Congress for its Minerva archiving project

- the National Endowment for the Humanities

- the British Arts and Humanities Research Council, and

- the International Political Science Association.

The Portable Library of Liberty

The 50th Anniversary Edition (2010) of the Portable Library of Liberty data DVD (PLL) contains 1,002 books in PDF format & 34 hours of MP3 audio files from Liberty Fund’s website The Online Library of Liberty (OLL) <oll.libertyfund.org>. Highlights include the complete scholarly editions of the works of Adam Smith, David Ricardo, J.S. Mill, the collected works of Jefferson, Madison, J. Adams,and 166 books published by Liberty Fund. It also contains a collection of Quotations about Liberty and Power, MP3 audio files from the Intellectual Portrait Series: Conversations with Leading Classical Liberal Figures of Our Time and the lecture series The Legacy of Friedrich Hayek.

The books and other resources in the Portable Library of Liberty data DVD are designed to be read or listened to on portable devices such as MP3 Players, smart phones, and E-Book Readers. Hence, this collection is called the “Portable” Library of Liberty and has material in the following formats: text-based PDF, MP3, and ePub.

Liberty Fund is happy to send a copy of this data DVD free of charge upon request for educational purposes. Please email the Director at <oll@libertyfund.org> and make sure you include your postal address.

Copyright and Fair Use Statement

There are four different types of texts which Liberty Fund has made available as part of the Online Library of Liberty website, the Portable Library of Liberty data DVD (PLL), and ePub titles for hand held reading devices:

1. public domain texts published before 1923. These texts are no longer under copyright and are in the public domain. We have put them online in order to further the educational aims of Liberty Fund.

2. texts to which the Liberty Fund has electronic rights, such as the books published by Liberty Fund in both print and online formats

3. other texts to which Liberty Fund has acquired the electronic rights from third parties, such as the journal Literature of Liberty (from the Institute for Humane Studies)

4. titles which are put online under license from third parties, such as the Glasgow Edition of the Works of Adam Smith (from Oxford University Press).

For titles in the first three categories listed above, no special permission from Liberty Fund is required for quoting material in papers and essays, or for limited photocopying and distribution for academic or other educational or non-profit purposes. The only requirements are that you include proper attribution on the first page of the document being distributed - e.g. for John Locke’s The Two Treatises of Government you would say one of the following:

- if using the OLL website - “This material originally appeared on the Online Library of Liberty hosted by Liberty Fund, Inc. URL: http://oll.libertyfund.org/title/222 and accessed on 2010-01-22.” This information can be found in the “Citation” button on the title’s table of contents page.

- or if using the copy on the PLL DVD - “This material originally appeared in the Portable Library of Liberty published by Liberty Fund, Inc. URL: http://oll.libertyfund.org/title/222 and PLL v5 (generated 22 January, 2010).” This information can be found in the footer of the EBook PDF.

- or if using the ePub version on a portable reading device: “This material is part of the collection of ePub titles in the Online Library of Liberty website hosted by Liberty Fund, Inc. Source Text URL http://oll.libertyfund.org/title/222 accessed on 2010-04-20.” This information can be found on the “Introduction to the Book” page in this file.

For titles in category two and three, any reprint of material “for profit”, such as a chapter or a substantial section of an online book for inclusion in a book or other publication for sale, requires written permission from Liberty Fund.

For titles in the fourth category you must follow the specific requirements of the copyright holder whose work we publish online under license. This information can be found in the “Introduction to the Book” page under the section “Copyright Information.” In the case of the Glasgow Edition of the Works of Adam Smith published under license from Oxford University Press, for reprint or copying permission you need to contact OUP directly. Under our contractual obligations with OUP we have placed the following declaration on the front page of every book and section of the online version of the Glasgow Edition of the Works of Adam Smith:

The Glasgow Edition of the Works and Correspondence of Adam Smith and the associated volumes are published in hardcover by Oxford University Press. The six titles of the Glasgow Edition, but not the associated volumes, are being published in soft cover by Liberty Fund. The online edition is published by Liberty Fund under license from Oxford University Press.

© Oxford University Press 1976. All rights reserved. No part of this material may be stored transmitted retransmitted lent or reproduced in any form or medium without the permission of Oxford University Press.

Thus, for reprint or copying permission you need to contact OUP directly. Liberty Fund cannot grant you this permission because it is not the copyright holder.

TWELFTH-NIGHT; OR, WHAT YOU WILL

DRAMATIS PERSONÆ.

O RSINO,

Duke of Illyria.

S EBASTIAN,

Brother to Viola.

A NTONIO,

a Sea Captain, Friend to Sebastian.

A Sea Captain,

Friend to Viola.

V ALENTINE, }

Gentlemen attending on the Duke.

C URIO, }

S IR TOBY BELCH,

Uncle to Olivia.

S IR ANDREW AGUECHEEK.

M ALVOLIO,

Steward to Olivia.

F ABIAN, }

Servants to Olivia.

F ESTE, a Clown, }

O LIVIA,

a rich Countess.

V IOLA,

in love with the Duke.

M ARIA,

Olivia’s Woman.

Lords, Priests, Sailors, Officers, Musicians, and other Attendants.

SCENE. — A City in Illyria; and the Sea-coast near it.

ACT I.

SCENE I.—: A Room in the DUKE’S Palace. Enter DUKE, CURIO, Lords; Musicians attending.

Duke.

If music be the food of love, play on;

Give me excess of it, that, surfeiting,

The appetite may sicken, and so die.

That strain again! it had a dying fall:  Craig1916: 4

O! it came o’er my ear like the sweet sound

That breathes upon a bank of violets,

Stealing and giving odour. Enough! no more:

’Tis not so sweet now as it was before.  Craig1916: 8

O spirit of love! how quick and fresh art thou,

That, notwithstanding thy capacity

Receiveth as the sea, nought enters there,

Of what validity and pitch soe’er,  Craig1916: 12

But falls into abatement and low price,

Even in a minute: so full of shapes is fancy,

That it alone is high fantastical.

Cur.

Will you go hunt, my lord?

Duke.

What, Curio?  Craig1916: 16

Cur.

The hart.

Duke.

Why, so I do, the noblest that I have.

O! when mine eyes did see Olivia first,

Methought she purg’d the air of pestilence.  Craig1916: 20

That instant was I turn’d into a hart,

And my desires, like fell and cruel hounds,

E’er since pursue me.

Enter VALENTINE.

How now! what news from her?

Val.

So please my lord, I might not be admitted;  Craig1916: 24

But from her handmaid do return this answer:

The element itself, till seven years’ heat,

Shall not behold her face at ample view;

But, like a cloistress, she will veiled walk,  Craig1916: 28

And water once a day her chamber round

With eve-offending brine: all this, to season

A brother’s dead love, which she would keep fresh

And lasting in her sad remembrance.  Craig1916: 32

Duke.

O! she that hath a heart of that fine frame

To pay this debt of love but to a brother,

How will she love, when the rich golden shaft

Hath kill’d the flock of all affections else  Craig1916: 36

That live in her; when liver, brain, and heart,

These sovereign thrones, are all supplied, and fill’d

Her sweet perfections with one self king.

Away before me to sweet beds of flowers;  Craig1916: 40

Love-thoughts lie rich when canopied with bowers.

[ Exeunt.

SCENE II.—: The Sea-coast.

Enter VIOLA, Captain, and Sailors.

Vio.

What country, friends, is this?

Cap.

This is Illyria, lady.

Vio.

And what should I do in Illyria?

My brother he is in Elysium.

Perchance he is not drown’d: what think you sailors?  Craig1916: 4

Cap.

It is perchance that you yourself were sav’d.

Vio.

O my poor brother! and so perchance may he be.

Cap.

True, madam: and, to comfort you with chance,

Assure yourself, after our ship did split,  Craig1916: 8

When you and those poor number sav’d with you

Hung on our driving boat, I saw your brother,

Most provident in peril, bind himself,—

Courage and hope both teaching him the practice,—  Craig1916: 12

To a strong mast that liv’d upon the sea;

Where, like Arion on the dolphin’s back,

I saw him hold acquaintance with the waves

So long as I could see.

Vio.

For saying so there’s gold.  Craig1916: 16

Mine own escape unfoldeth to my hope,

Whereto thy speech serves for authority,

The like of him. Know’st thou this country?

Cap.

Ay, madam, well; for I was bred and born  Craig1916: 20

Not three hours’ travel from this very place.

Vio.

Who governs here?

Cap.

A noble duke, in nature as in name.

Vio.

What is his name?  Craig1916: 24

Cap.

Orsino.

Vio.

Orsino! I have heard my father name him:

He was a bachelor then.

Cap.

And so is now, or was so very late;  Craig1916: 28

For but a month ago I went from hence,

And then ’twas fresh in murmur,—as, you know,

What great ones do the less will prattle of,—

That he did seek the love of fair Olivia.  Craig1916: 32

Vio.

What’s she?

Cap.

A virtuous maid, the daughter of a count

That died some twelvemonth since; then leaving her

In the protection of his son, her brother,  Craig1916: 36

Who shortly also died: for whose dear love,

They say she hath abjur’d the company

And sight of men.

Vio.

O! that I serv’d that lady,

And might not be deliver’d to the world,  Craig1916: 40

Till I had made mine own occasion mellow,

What my estate is.

Cap.

That were hard to compass,

Because she will admit no kind of suit,

No, not the duke’s.  Craig1916: 44

Vio.

There is a fair behaviour in thee, captain;

And though that nature with a beauteous wall

Doth oft close in pollution, yet of thee

I will believe thou hast a mind that suits  Craig1916: 48

With this thy fair and outward character.

I prithee,—and I’ll pay thee bounteously,—

Conceal me what I am, and be my aid

For such disguise as haply shall become  Craig1916: 52

The form of my intent. I’ll serve this duke:

Thou shalt present me as a eunuch to him:

It may be worth thy pains; for I can sing

And speak to him in many sorts of music  Craig1916: 56

That will allow me very worth his service.

What else may hap to time I will commit;

Only shape thou thy silence to my wit.

Cap.

Be you his eunuch, and your mute I’ll be:  Craig1916: 60

When my tongue blabs, then let mine eyes not see.

Vio.

I thank thee: lead me on.

[ Exeunt.

SCENE III.—: A Room in OLIVIA’S House.

Enter SIR TOBY BELCH and MARIA.

Sir To.

What a plague means my niece, to take the death of her brother thus? I am sure care’s an enemy to life.

Mar.

By my troth, Sir Toby, you must come in earlier o’ nights: your cousin, my lady, takes great exceptions to your ill hours.  Craig1916: 6

Sir To.

Why, let her except before excepted.

Mar.

Ay, but you must confine yourself within the modest limits of order.

Sir To.

Confine! I’ll confine myself no finer than I am. These clothes are good enough to drink in, and so be these boots too: an they be not, let them hang themselves in their own straps.  Craig1916: 14

Mar.

That quaffing and drinking will undo you: I heard my lady talk of it yesterday; and of a foolish knight that you brought in one night here to be her wooer.

Sir To.

Who? Sir Andrew Aguecheek?

Mar.

Ay, he.  Craig1916: 20

Sir To.

He’s as tall a man as any’s in Illyria.

Mar.

What’s that to the purpose?

Sir To.

Why, he has three thousand ducats a year.  Craig1916: 24

Mar.

Ay, but he’ll have but a year in all these ducats: he’s a very fool and a prodigal.

Sir To.

Fie, that you’ll say so! he plays o’ the viol-de-gamboys, and speaks three or four languages word for word without book, and hath all the good gifts of nature.  Craig1916: 30

Mar.

He hath indeed, almost natural; for, besides that he’s a fool, he’s a great quarreller; and but that he hath the gift of a coward to allay the gust he hath in quarrelling, ’tis thought among the prudent he would quickly have the gift of a grave.  Craig1916: 36

Sir To.

By this hand, they are scoundrels and substractors that say so of him. Who are they?

Mar.

They that add, moreover, he’s drunk nightly in your company.  Craig1916: 40

Sir To.

With drinking healths to my niece. I’ll drink to her as long as there is a passage in my throat and drink in Illyria. He’s a coward and a coystril, that will not drink to my niece till his brains turn o’ the toe like a parish-top. What, wench! Castiliano vulgo! for here comes Sir Andrew Agueface.

Enter SIR ANDREW AGUECHEEK.

Sir And.

Sir Toby Belch! how now, Sir Toby Belch!  Craig1916: 49

Sir To.

Sweet Sir Andrew!

Sir And.

Bless you, fair shrew.

Mar.

And you too, sir.  Craig1916: 52

Sir To.

Accost, Sir Andrew, accost.

Sir And.

What’s that?

Sir To.

My niece’s chambermaid.

Sir And.

Good Mistress Accost, I desire better acquaintance.  Craig1916: 57

Mar.

My name is Mary, sir.

Sir And.

Good Mistress Mary Accost,—

Sir To.

You mistake, knight: ‘accost’ is, front her, board her, woo her, assail her.  Craig1916: 61

Sir And.

By my troth, I would not undertake her in this company. Is that the meaning of ‘accost?’  Craig1916: 64

Mar.

Fare you well, gentlemen.

Sir To.

An thou let her part so, Sir Andrew, would thou mightst never draw sword again!

Sir And.

An you part so, mistress, I would I might never draw sword again. Fair lady, do you think you have fools in hand?  Craig1916: 70

Mar.

Sir, I have not you by the hand.

Sir And.

Marry, but you shall have; and here’s my hand.

Mar.

Now, sir, ‘thought is free:’ I pray you, bring your hand to the buttery-bar and let it drink.  Craig1916: 76

Sir And.

Wherefore, sweetheart? what’s your metaphor?

Mar.

It’s dry, sir.

Sir And.

Why, I think so: I am not such an ass but I can keep my hand dry. But what’s your jest?

Mar.

A dry jest, sir.

Sir And.

Are you full of them?  Craig1916: 84

Mar.

Ay, sir, I have them at my fingers’ ends: marry, now I let go your hand, I am barren.

[ Exit.

Sir To.

O knight! thou lackest a cup of canary: when did I see thee so put down?  Craig1916: 88

Sir And.

Never in your life, I think; unless you see canary put me down. Methinks sometimes I have no more wit than a Christian or an ordinary man has; but I am a great eater of beef, and I believe that does harm to my wit.  Craig1916: 93

Sir To.

No question.

Sir And.

An I thought that, I’d forswear it.

I’ll ride home to-morrow, Sir Toby.  Craig1916: 96

Sir To.

Pourquoi, my dear knight?

Sir And.

What is ‘pourquoi?’ do or not do? I would I had bestowed that time in the tongues that I have in fencing, dancing, and bear-baiting. O! had I but followed the arts!  Craig1916: 101

Sir To.

Then hadst thou had an excellent head of hair.

Sir And.

Why, would that have mended my hair?  Craig1916: 105

Sir To.

Past question; for thou seest it will not curl by nature.

Sir And.

But it becomes me well enough, does’t not?  Craig1916: 109

Sir To.

Excellent; it hangs like flax on a distaff, and I hope to see a housewife take thee between her legs, and spin it off.  Craig1916: 112

Sir And.

Faith, I’ll home to-morrow, Sir Toby: your niece will not be seen; or if she be, it’s four to one she’ll none of me. The count himself here hard by woos her.  Craig1916: 116

Sir To.

She’ll none o’ the count; she’ll not match above her degree, neither in estate, years, nor wit; I have heard her swear it. Tut, there’s life in’t, man.  Craig1916: 120

Sir And.

I’ll stay a month longer. I am a fellow o’ the strangest mind i’ the world; I delight in masques and revels sometimes altogether.

Sir To.

Art thou good at these kickchawses, knight?  Craig1916: 125

Sir And.

As any man in Illyria, whatsoever he be, under the degree of my betters: and yet I will not compare with an old man.  Craig1916: 128

Sir To.

What is thy excellence in a galliard, knight?

Sir And.

Faith, I can cut a caper.

Sir To.

And I can cut the mutton to’t.  Craig1916: 132

Sir And.

And I think I have the back-trick simply as strong as any man in Illyria.

Sir To.

Wherefore are these things hid? wherefore have these gifts a curtain before ’em? are they like to take dust, like Mistress Mall’s picture? why dost thou not go to church in a galliard, and come home in a coranto? My very walk should be a jig: I would not so much as make water but in a sink-a-pace. What dost thou mean? is it a world to hide virtues in? I did think, by the excellent constitution of thy leg, it was formed under the star of a galliard.  Craig1916: 144

Sir And.

Ay, ’tis strong, and it does indifferent well in a flame-coloured stock. Shall we set about some revels?

Sir To.

What shall we do else? were we not born under Taurus?  Craig1916: 149

Sir And.

Taurus! that’s sides and heart.

Sir To.

No, sir, it is legs and thighs. Let me see thee caper. Ha! higher: ha, ha! excellent!

[ Exeunt.

SCENE IV.—: A Room in the DUKE’S Palace.

Enter VALENTINE, and VIOLA in man’s attire.

Val.

If the duke continue these favours towards you, Cesario, you are like to be much advanced: he hath known you but three days, and already you are no stranger.  Craig1916: 4

Vio.

You either fear his humour or my negligence, that you call in question the continuance of his love. Is he inconstant, sir, in his favours?

Val.

No, believe me.  Craig1916: 8

Vio.

I thank you. Here comes the count.

Enter DUKE, CURIO, and Attendants.

Duke.

Who saw Cesario? ho!

Vio.

On your attendance, my lord; here.

Duke.

Stand you awhile aloof. Cesario,  Craig1916: 12

Thou know’st no less but all; I have unclasp’d

To thee the book even of my secret soul:

Therefore, good youth, address thy gait unto her,

Be not denied access, stand at her doors,  Craig1916: 16

And tell them, there thy fixed foot shall grow

Till thou have audience.

Vio.

Sure, my noble lord,

If she be so abandon’d to her sorrow

As it is spoke, she never will admit me.  Craig1916: 20

Duke.

Be clamorous and leap all civil bounds

Rather than make unprofited return.

Vio.

Say I do speak with her, my lord, what then?

Duke.

O! then unfold the passion of my love;

Surprise her with discourse of my dear faith:  Craig1916: 25

It shall become thee well to act my woes;

She will attend it better in thy youth

Than in a nuncio of more grave aspect.  Craig1916: 28

Vio.

I think not so, my lord.

Duke.

Dear lad, believe it;

For they shall yet belie thy happy years

That say thou art a man: Diana’s lip

Is not more smooth and rubious; thy small pipe

Is as the maiden’s organ, shrill and sound;  Craig1916: 33

And all is semblative a woman’s part.

I know thy constellation is right apt

For this affair. Some four or five attend him;

All, if you will; for I myself am best  Craig1916: 37

When least in company. Prosper well in this,

And thou shalt live as freely as thy lord,

To call his fortunes thine.

Vio.

I’ll do my best  Craig1916: 40

To woo your lady: [ Aside ] yet, a barful strife!

Whoe’er I woo, myself would be his wife.

[ Exeunt.

SCENE V.—: A Room in OLIVIA’S House.

Enter MARIA and Clown.

Mar.

Nay, either tell me where thou hast been, or I will not open my lips so wide as a bristle may enter in way of thy excuse. My lady will hang thee for thy absence.  Craig1916: 4

Clo.

Let her hang me: he that is well hanged in this world needs to fear no colours.

Mar.

Make that good.

Clo.

He shall see none to fear.  Craig1916: 8

Mar.

A good lenten answer: I can tell thee where that saying was born, of, ‘I fear no colours.’

Clo.

Where, good Mistress Mary?

Mar.

In the wars; and that may you be bold to say in your foolery.  Craig1916: 13

Clo.

Well, God give them wisdom that have it; and those that are fools, let them use their talents.  Craig1916: 16

Mar.

Yet you will be hanged for being so long absent; or, to be turned away, is not that as good as a hanging to you?

Clo.

Many a good hanging prevents a bad marriage; and, for turning away, let summer bear it out.  Craig1916: 22

Mar.

You are resolute then?

Clo.

Not so, neither; but I am resolved on two points.  Craig1916: 25

Mar.

That if one break, the other will hold; or, if both break, your gaskins fall.

Clo.

Apt, in good faith; very apt. Well, go thy way: if Sir Toby would leave drinking, thou wert as witty a piece of Eve’s flesh as any in Illyria.  Craig1916: 30

Mar.

Peace, you rogue, no more o’ that. Here comes my lady: make your excuse wisely, you were best.

[ Exit.

Clo.

Wit, an’t be thy will, put me into good fooling! Those wits that think they have thee, do very oft prove fools; and I, that am sure I lack thee, may pass for a wise man: for what says Quinapalus? ‘Better a witty fool than a foolish wit.’

Enter OLIVIA with MALVOLIO.

God bless thee, lady!  Craig1916: 40

Oli.

Take the fool away.

Clo.

Do you not hear, fellows? Take away the lady.

Oli.

Go to, you’re a dry fool; I’ll no more of you: besides, you grow dishonest.  Craig1916: 45

Clo.

Two faults, madonna, that drink and good counsel will amend: for give the dry fool drink, then is the fool not dry; bid the dishonest man mend himself: if he mend, he is no longer dishonest; if he cannot, let the botcher mend him. Any thing that’s mended is but patched: virtue that transgresses is but patched with sin; and sin that amends is but patched with virtue. If that this simple syllogism will serve, so; if it will not, what remedy? As there is no true cuckold but calamity, so beauty’s a flower. The lady bade take away the fool; therefore, I say again, take her away.  Craig1916: 58

Oli.

Sir, I bade them take away you.

Clo.

Misprision in the highest degree! Lady, cucullus non facit monachum; that’s as much to say as I wear not motley in my brain. Good madonna, give me leave to prove you a fool.

Oli.

Can you do it?  Craig1916: 64

Clo.

Dexteriously, good madonna.

Oli.

Make your proof.

Clo.

I must catechise you for it, madonna: good my mouse of virtue, answer me.  Craig1916: 68

Oli.

Well, sir, for want of other idleness, I’ll bide your proof.

Clo.

Good madonna, why mournest thou?

Oli.

Good fool, for my brother’s death.  Craig1916: 72

Clo.

I think his soul is in hell, madonna.

Oli.

I know his soul is in heaven, fool.

Clo.

The more fool, madonna, to mourn for your brother’s soul being in heaven. Take away the fool, gentlemen.  Craig1916: 77

Oli.

What think you of this fool, Malvolio? doth he not mend?

Mal.

Yes; and shall do, till the pangs of death shake him: infirmity, that decays the wise, doth ever make the better fool.  Craig1916: 82

Clo.

God send you, sir, a speedy infirmity, for the better increasing your folly! Sir Toby will be sworn that I am no fox, but he will not pass his word for two pence that you are no fool.

Oli.

How say you to that, Malvolio?  Craig1916: 87

Mal.

I marvel your ladyship takes delight in such a barren rascal: I saw him put down the other day with an ordinary fool that has no more brain than a stone. Look you now, he’s out of his guard already; unless you laugh and minister occasion to him, he is gagged. I protest, I take these wise men, that crow so at these set kind of fools, no better than the fools’ zanies.  Craig1916: 95

Oli.

O! you are sick of self-love, Malvolio, and taste with a distempered appetite. To be generous, guiltless, and of free disposition, is to take those things for bird-bolts that you deem cannon-bullets. There is no slander in an allowed fool, though he do nothing but rail; nor no railing in a known discreet man, though he do nothing but reprove.

Clo.

Now, Mercury endue thee with leasing, for thou speakest well of fools!  Craig1916: 105

Re-enter MARIA.

Mar.

Madam, there is at the gate a young gentleman much desires to speak with you.

Oli.

From the Count Orsino, is it?  Craig1916: 108

Mar.

I know not, madam: ’tis a fair young man, and well attended.

Oli.

Who of my people hold him in delay?

Mar.

Sir Toby, madam, your kinsman.  Craig1916: 112

Oli.

Fetch him off, I pray you: he speaks nothing but madman. Fie on him! [ Exit MARIA. ] Go you, Malvolio: if it be a suit from the count, I am sick, or not at home; what you will, to dismiss it. [ Exit MALVOLIO. ] Now you see, sir, how your fooling grows old, and people dislike it.

Clo.

Thou hast spoken for us, madonna, as if thy eldest son should be a fool; whose skull Jove cram with brains! for here comes one of thy kin has a most weak pia mater.

Enter SIR TOBY BELCH.

Oli.

By mine honour, half drunk. What is he at the gate, cousin?  Craig1916: 124

Sir To.

A gentleman.

Oli.

A gentleman! what gentleman?

Sir To.

’Tis a gentleman here,—a plague o’ these pickle herring! How now, sot!  Craig1916: 128

Clo.

Good Sir Toby.

Oli.

Cousin, cousin, how have you come so early by this lethargy?

Sir To.

Lechery! I defy lechery! There’s one at the gate.  Craig1916: 133

Clo.

Ay, marry, what is he?

Sir To.

Let him be the devil, an he will, I care not: give me faith, say I. Well, it’s all one.

[ Exit.

Oli.

What’s a drunken man like, fool?  Craig1916: 137

Clo.

Like a drowned man, a fool, and a madman: one draught above heat makes him a fool, the second mads him, and a third drowns him.

Oli.

Go thou and seek the crowner, and let him sit o’ my coz; for he’s in the third degree of drink, he’s drowned: go, look after him.  Craig1916: 144

Clo.

He is but mad yet, madonna; and the fool shall look to the madman.

[ Exit.

Re-enter MALVOLIO.

Mal.

Madam, yond young fellow swears he will speak with you. I told him you were sick: he takes on him to understand so much, and therefore comes to speak with you. I told him you were asleep: he seems to have a foreknowledge of that too, and therefore comes to speak with you. What is to be said to him, lady? he’s fortified against any denial.  Craig1916: 154

Oli.

Tell him he shall not speak with me.

Mal.

Ha’s been told so; and he says, he’ll stand at your door like a sheriff’s post, and be the supporter to a bench, but he’ll speak with you.

Oli.

What kind o’ man is he?  Craig1916: 160

Mal.

Why, of mankind.

Oli.

What manner of man?

Mal.

Of very ill manner: he’ll speak with you, will you or no.  Craig1916: 164

Oli.

Of what personage and years is he?

Mal.

Not yet old enough for a man, nor young enough for a boy; as a squash is before ’tis a peascod, or a codling when ’tis almost an apple: ’tis with him in standing water, between boy and man. He is very well-favoured, and he speaks very shrewishly: one would think his mother’s milk were scarce out of him.  Craig1916: 172

Oli.

Let him approach. Call in my gentlewoman.

Mal.

Gentlewoman, my lady calls.

[ Exit.

Re-enter MARIA.

Oli.

Give me my veil: come, throw it o’er my face.  Craig1916: 176

We’ll once more hear Orsino’s embassy.

Enter VIOLA and Attendants.

Vio.

The honourable lady of the house, which is she?

Oli.

Speak to me; I shall answer for her.

Your will?  Craig1916: 181

Vio.

Most radiant, exquisite, and unmatchable beauty,—I pray you tell me if this be the lady of the house, for I never saw her: I would be loath to cast away my speech; for, besides that it is excellently well penned, I have taken great pains to con it. Good beauties, let me sustain no scorn; I am very comptible, even to the least sinister usage.  Craig1916: 189

Oli.

Whence came you, sir?

Vio.

I can say little more than I have studied, and that question’s out of my part. Good gentle one, give me modest assurance if you be the lady of the house, that I may proceed in my speech.

Oli.

Are you a comedian?  Craig1916: 195

Vio.

No, my profound heart; and yet, by the very fangs of malice I swear I am not that I play. Are you the lady of the house?

Oli.

If I do not usurp myself, I am.  Craig1916: 199

Vio.

Most certain, if you are she, you do usurp yourself; for, what is yours to bestow is not yours to reserve. But this is from my commission: I will on with my speech in your praise, and then show you the heart of my message.  Craig1916: 204

Oli.

Come to what is important in’t: I forgive you the praise.

Vio.

Alas! I took great pains to study it, and ’tis poetical.  Craig1916: 208

Oli.

It is the more like to be feigned: I pray you keep it in. I heard you were saucy at my gates, and allowed your approach rather to wonder at you than to hear you. If you be not mad, be gone; if you have reason, be brief: ’tis not that time of moon with me to make one in so skipping a dialogue.  Craig1916: 215

Mar.

Will you hoist sail, sir? here lies your way.

Vio.

No, good swabber; I am to hull here a little longer. Some mollification for your giant, sweet lady.

Oli.

Tell me your mind.  Craig1916: 220

Vio.

I am a messenger.

Oli.

Sure, you have some hideous matter to deliver, when the courtesy of it is so fearful. Speak your office.  Craig1916: 224

Vio.

It alone concerns your ear. I bring no overture of war, no taxation of homage: I hold the olive in my hand; my words are as full of peace as matter.  Craig1916: 228

Oli.

Yet you began rudely. What are you? what would you?

Vio.

The rudeness that hath appear’d in me have I learn’d from my entertainment. What I am, and what I would, are as secret as maiden-head; to your ears, divinity; to any other’s, profanation.  Craig1916: 235

Oli.

Give us the place alone: we will hear this divinity. [ Exit MARIA and Attendants.] Now, sir; what is your text?

Vio.

Most sweet lady,—

Oli.

A comfortable doctrine, and much may be said of it. Where lies your text?  Craig1916: 241

Vio.

In Orsino’s bosom.

Oli.

In his bosom! In what chapter of his bosom?  Craig1916: 244

Vio.

To answer by the method, in the first of his heart.

Oli.

O! I have read it: it is heresy. Have you no more to say?  Craig1916: 248

Vio.

Good madam, let me see your face.

Oli.

Have you any commission from your lord to negotiate with my face? you are now out of your text: but we will draw the curtain and show you the picture. [ Unveiling. ] Look you, sir, such a one I was as this present: is’t not well done?

Vio.

Excellently done, if God did all.  Craig1916: 256

Oli.

’Tis in grain, sir; ’twill endure wind and weather.

Vio.

’Tis beauty truly blent, whose red and white

Nature’s own sweet and cunning hand laid on:

Lady, you are tho cruell’st she alive,  Craig1916: 261

If you will lead these graces to the grave

And leave the world no copy.

Oli.

O! sir, I will not be so hard-hearted; I will give out divers schedules of my beauty: it shall be inventoried, and every particle and utensil labelled to my will: as Item, Two lips, indifferent red; Item, Two grey eyes, with lids to them; Item, One neck, one chin, and so forth. Were you sent hither to praise me?

Vio.

I see you what you are: you are too proud;

But, if you were the devil, you are fair.  Craig1916: 272

My lord and master loves you: O! such love

Could be but recompens’d, though you were crown’d

The nonpareil of beauty.

Oli.

How does he love me?

Vio.

With adorations, with fertile tears,  Craig1916: 276

With groans that thunder love, with sighs of fire.

Oli.

Your lord does know my mind; I cannot love him;

Yet I suppose him virtuous, know him noble,

Of great estate, of fresh and stainless youth;  Craig1916: 280

In voices well divulg’d, free, learn’d, and valiant;

And, in dimension and the shape of nature

A gracious person; but yet I cannot love him:

He might have took his answer long ago.  Craig1916: 284

Vio.

If I did love you in my master’s flame,

With such a suffering, such a deadly life,

In your denial I would find no sense;

I would not understand it.

Oli.

Why, what would you?  Craig1916: 288

Vio.

Make me a willow cabin at your gate,

And call upon my soul within the house;

Write loyal cantons of contemned love,

And sing them loud even in the dead of night;

Holla your name to the reverberate hills,  Craig1916: 293

And make the babbling gossip of the air

Cry out, ‘Olivia!’ O! you should not rest

Between the elements of air and earth,  Craig1916: 296

But you should pity me!

Oli.

You might do much. What is your parentage?

Vio.

Above my fortune, yet my state is well:

I am a gentleman.

Oli.

Get you to your lord:  Craig1916: 300

I cannot love him. Let him send no more,

Unless, perchance, you come to me again,

To tell me how he takes it. Fare you well:

I thank you for your pains: spend this for me.

Vio.

I am no fee’d post, lady; keep your purse:  Craig1916: 305

My master, not myself, lacks recompense.

Love make his heart of flint that you shall love,

And let your fervour, like my master’s, be  Craig1916: 308

Plac’d in contempt! Farewell, fair cruelty.

[ Exit.

Oli.

‘What is your parentage?’

‘Above my fortunes, yet my state is well:

I am a gentleman.’ I’ll be sworn thou art:  Craig1916: 312

Thy tongue, thy face, thy limbs, actions, and spirit,

Do give thee five-fold blazon. Not too fast: soft! soft!

Unless the master were the man. How now!

Even so quickly may one catch the plague?  Craig1916: 316

Methinks I feel this youth’s perfections

With an invisible and subtle stealth

To creep in at mine eyes. Well, let it be.

What, ho! Malvolio!

Re-enter MALVOLIO.

Mal.

Here, madam, at your service.  Craig1916: 320

Oli.

Run after that same peevish messenger,

The county’s man: he left this ring behind him,

Would I, or not: tell him I’ll none of it.

Desire him not to flatter with his lord,  Craig1916: 324

Nor hold him up with hopes: I’m not for him.

If that the youth will come this way to-morrow,

I’ll give him reasons for’t. Hie thee, Malvolio.

Mal.

Madam, I will.

[ Exit.

Oli.

I do I know not what, and fear to find  Craig1916: 329

Mine eye too great a flatterer for my mind.

Fate, show thy force: ourselves we do not owe;

What is decreed must be, and be this so!

[ Exit.

ACT II.

SCENE I.—: The Sea-coast.

Enter ANTONIO and SEBASTIAN.

Ant.

Will you stay no longer? nor will you not that I go with you?

Seb.

By your patience, no. My stars shine darkly over me; the malignancy of my fate might, perhaps, distemper yours; therefore I shall crave of you your leave that I may bear my evils alone. It were a bad recompense for your love to lay any of them on you.  Craig1916: 8

Ant.

Let me yet know of you whither you are bound.

Seb.

No, sooth, sir: my determinate voyage is mere extravagancy. But I perceive in you so excellent a touch of modesty that you will not extort from me what I am willing to keep in; therefore, it charges me in manners the rather to express myself. You must know of me then, Antonio, my name is Sebastian, which I called Roderigo. My father was that Sebastian of Messaline, whom I know you have heard of. He left behind him myself and a sister, both born in an hour: if the heavens had been pleased, would we had so ended! but you, sir, altered that; for some hour before you took me from the breach of the sea was my sister drowned.  Craig1916: 24

Ant.

Alas the day!

Seb.

A lady, sir, though it was said she much resembled me, was yet of many accounted beautiful: but, though I could not with such estimable wonder overfar believe that, yet thus far I will boldly publish her: she bore a mind that envy could not but call fair. She is drowned already, sir, with salt water, though I seem to drown her remembrance again with more.  Craig1916: 33

Ant.

Pardon me, sir, your bad entertainment.

Seb.

O good Antonio! forgive me your trouble!  Craig1916: 36

Ant.

If you will not murder me for my love, let me be your servant.

Seb.

If you will not undo what you have done, that is, kill him whom you have recovered, desire it not. Fare ye well at once: my bosom is full of kindness; and I am yet so near the manners of my mother, that upon the least occasion more mine eyes will tell tales of me. I am bound to the Count Orsino’s court: farewell.

[ Exit.

Ant.

The gentleness of all the gods go with thee!

I have many enemies in Orsino’s court,  Craig1916: 48

Else would I very shortly see thee there;

But, come what may, I do adore thee so,

That danger shall seem sport, and I will go.

[ Exit.

SCENE II.—: A Street.

Enter VIOLA; MALVOLIO following.

Mal.

Were not you even now with the Countess Olivia?

Vio.

Even now, sir: on a moderate pace I have since arrived but hither.  Craig1916: 4

Mal.

She returns this ring to you, sir: you might have saved me my pains, to have taken it away yourself. She adds, moreover, that you should put your lord into a desperate assurance she will none of him. And one thing more; that you be never so hardy to come again in his affairs, unless it be to report your lord’s taking of this. Receive it so.  Craig1916: 12

Vio.

She took the ring of me; I’ll none of it.

Mal.

Come, sir, you peevishly threw it to her; and her will is it should be so returned: if it be worth stooping for, there it lies in your eye; if not, be it his that finds it.

[ Exit.

Vio.

I left no ring with her: what means this lady?

Fortune forbid my outside have not charm’d her!

She made good view of me; indeed, so much,  Craig1916: 20

That sure methought her eyes had lost her tongue,

For she did speak in starts distractedly.

She loves me, sure; the cunning of her passion

Invites me in this churlish messenger.  Craig1916: 24

None of my lord’s ring! why, he sent her none.

I am the man: if it be so, as ’tis,

Poor lady, she were better love a dream.

Disguise, I see, thou art a wickedness,  Craig1916: 28

Wherein the pregnant enemy does much.

How easy is it for the proper-false

In women’s waxen hearts to set their forms!

Alas! our frailty is the cause, not we!  Craig1916: 32

For such as we are made of, such we be.

How will this fadge? My master loves her dearly;

And I, poor monster, fond as much on him;

And she, mistaken, seems to dote on me.  Craig1916: 36

What will become of this? As I am man,

My state is desperate for my master’s love;

As I am woman,—now alas the day!—

What thriftless sighs shall poor Olivia breathe!

O time! thou must untangle this, not I;  Craig1916: 41

It is too hard a knot for me to untie.

[ Exit.

SCENE III.—: A Room in OLIVIA’S House.

Enter SIR TOBY BELCH and SIR ANDREW AGUECHEEK.

Sir To.

Approach, Sir Andrew: not to be a-bed after midnight is to be up betimes; and diluculo surgere, thou knowest,—

Sir And.

Nay, by my troth, I know not; but I know, to be up late is to be up late.  Craig1916: 5

Sir To.

A false conclusion: I hate it as an unfilled can. To be up after midnight and to go to bed then, is early; so that to go to bed after midnight is to go to bed betimes. Does not our life consist of the four elements?

Sir And.

Faith, so they say; but, I think, it rather consists of eating and drinking.  Craig1916: 12

Sir To.

Thou art a scholar; let us therefore eat and drink. Marian, I say! a stoup of wine!

Enter Clown.

Sir And.

Here comes the fool, i’ faith.

Clo.

How now, my hearts! Did you never see the picture of ‘we three?’  Craig1916: 17

Sir To.

Welcome, ass. Now let’s have a catch.

Sir And.

By my troth, the fool has an excellent breast. I had rather than forty shillings I had such a leg, and so sweet a breath to sing, as the fool has. In sooth, thou wast in very gracious fooling last night, when thou spokest of Pigrogromitus, of the Vapians passing the equinoctial of Queubus: ’twas very good, i’ faith. I sent thee sixpence for thy leman: hadst it?  Craig1916: 27

Clo.

I did impeticos thy gratillity; for Malvolio’s nose is no whipstock: my lady has a white hand, and the Myrmidons are no bottleale houses.

Sir And.

Excellent! Why, this is the best fooling, when all is done. Now, a song.  Craig1916: 33

Twelfth-Night, by E.A. Abbey.

Sir To.

Come on; there is sixpence for you: let’s have a song.

Sir And.

There’s a testril of me too: if one knight give a—  Craig1916: 37

Clo.

Would you have a love-song, or a song of good life?

Sir To.

A love-song, a love-song.  Craig1916: 40

Sir And.

Ay, ay; I care not for good life.

Clo.

- O mistress mine! where are you roaming?

- O! stay and hear; your true love’s coming,

- That can sing both high and low.  Craig1916: 44

- Trip no further, pretty sweeting;

- Journeys end in lovers meeting,

- Every wise man’s son doth know.

Sir And.

Excellent good, i’ faith.  Craig1916: 48

Sir To.

Good, good.

Clo.

- What is love? ’tis not hereafter;

- Present mirth hath present laughter;

- What’s to come is still unsure:  Craig1916: 52

- In delay there lies no plenty;

- Then come kiss me, sweet and twenty,

- Youth’s a stuff will not endure.

Sir And.

A mellifluous voice, as I am true knight.  Craig1916: 57

Sir To.

A contagious breath.

Sir And.

Very sweet and contagious, i’ faith.

Sir To.

To hear by the nose, it is dulcet in contagion. But shall we make the welkin dance indeed? Shall we rouse the night-owl in a catch that will draw three souls out of one weaver? shall we do that?  Craig1916: 64

Sir And.

An you love me, let’s do’t: I am dog at a catch.

Clo.

By’r lady, sir, and some dogs will catch well.  Craig1916: 68

Sir And.

Most certain. Let our catch be, ‘Thou knave.’

Clo.

Hold thy peace, thou knave,’ knight? I shall be constrain’d in’t to call thee knave, knight.  Craig1916: 73

Sir And.

’Tis not the first time I have constrained one to call me knave. Begin, fool: it begins, ‘Hold thy peace.’  Craig1916: 76

Clo.

I shall never begin if I hold my peace.

Sir And.

Good, i’ faith. Come, begin.

[ They sing a catch.

Enter MARIA.

Mar.

What a caterwauling do you keep here! If my lady have not called up her steward Malvolio and bid him turn you out of doors, never trust me.  Craig1916: 82

Sir To.

My lady’s a Cataian; we are politicians; Malvolio’s a Peg-a-Ramsey, and ‘Three merry men be we.’ Am not I consanguineous? am I not of her blood? Tillyvally, lady!

There dwelt a man in Babylon, lady, lady!

Clo.

Beshrew me, the knight’s in admirable fooling.  Craig1916: 89

Sir And.

Ay, he does well enough if he be disposed, and so do I too: he does it with a better grace, but I do it more natural.

Sir To.

O! the twelfth day of December, —

Mar.

For the love o’ God, peace!  Craig1916: 94

Enter MALVOLIO.

Mal.

My masters, are you mad? or what are you? Have you no wit, manners, nor honesty, but to gabble like tinkers at this time of night? Do ye make an alehouse of my lady’s house, that ye squeak out your coziers’ catches without any mitigation or remorse of voice? Is there no respect of place, persons, nor time, in you?  Craig1916: 101

Sir To.

We did keep time, sir, in our catches. Sneck up!

Mal.

Sir Toby, I must be round with you. My lady bade me tell you, that, though she harbours you as her kinsman, she’s nothing allied to your disorders. If you can separate yourself and your misdemeanours, you are welcome to the house; if not, an it would please you to take leave of her, she is very willing to bid you farewell.

Sir To.

Farewell, dear heart, since I must needs be gone.  Craig1916: 112

Mar.

Nay, good Sir Toby.

Clo.

His eyes do show his days are almost done.

Mal.

Is’t even so?

Sir To.

But I will never die.  Craig1916: 116

Clo.

Sir Toby, there you lie.

Mal.

This is much credit to you.

Sir To.

Shall I bid him go?

Clo.

What an if you do?  Craig1916: 120

Sir To.

Shall I bid him go, and spare not?

Clo.

O! no, no, no, no, you dare not.

Sir To.

‘Out o’ time!’ Sir, ye lie. Art any more than a steward? Dost thou think, because thou art virtuous, there shall be no more cakes and ale?

Clo.

Yes, by Saint Anne; and ginger shall be hot i’ the mouth too.  Craig1916: 128

Sir To.

Thou’rt i’ the right. Go, sir, rub your chain with crumbs. A stoup of wine, Maria!

Mal.

Mistress Mary, if you prized my lady’s favour at anything more than contempt, you would not give means for this uncivil rule: she shall know of it, by this hand.

[ Exit.

Mar.

Go shake your ears.  Craig1916: 135

Sir And.

’Twere as good a deed as to drink when a man’s a-hungry, to challenge him the field, and then to break promise with him and make a fool of him.

Sir To.

Do’t, knight: I’ll write thee a challenge; or I’ll deliver thy indignation to him by word of mouth.  Craig1916: 142

Mar.

Sweet Sir Toby, be patient for to-night: since the youth of the count’s was to-day with my lady, she is much out of quiet. For Monsieur Malvolio, let me alone with him: if I do not gull him into a nayword, and make him a common recreation, do not think I have wit enough to lie straight in my bed. I know I can do it.

Sir To.

Possess us, possess us; tell us something of him.  Craig1916: 152

Mar.

Marry, sir, sometimes he is a kind of puritan.

Sir And.

O! if I thought that, I’d beat him like a dog.  Craig1916: 156

Sir To.

What, for being a puritan? thy exquisite reason, dear knight?

Sir And.

I have no exquisite reason for’t, but I have reason good enough.  Craig1916: 160

Mar.

The devil a puritan that he is, or anything constantly but a time-pleaser; an affectioned ass, that cons state without book, and utters it by great swarths: the best persuaded of himself; so crammed, as he thinks, with excellences, that it is his ground of faith that all that look on him love him; and on that vice in him will my revenge find notable cause to work.  Craig1916: 169

Sir To.

What wilt thou do?

Mar.

I will drop in his way some obscure epistles of love; wherein, by the colour of his beard, the shape of his leg, the manner of his gait, the expressure of his eye, forehead, and complexion, he shall find himself most feelingly personated. I can write very like my lady your niece; on a forgotten matter we can hardly make distinction of our hands.

Sir To.

Excellent! I smell a device.

Sir And.

I have’t in my nose too.  Craig1916: 180

Sir To.

He shall think, by the letters that thou wilt drop, that they come from my niece, and that she is in love with him.

Mar.

My purpose is, indeed, a horse of that colour.  Craig1916: 185

Sir And.

And your horse now would make him an ass.

Mar.

Ass, I doubt not.  Craig1916: 188

Sir And.

O! ’twill be admirable.

Mar.

Sport royal, I warrant you: I know my physic will work with him. I will plant you two, and let the fool make a third, where he shall find the letter: observe his construction of it. For this night, to bed, and dream on the event. Farewell.

[ Exit.

Sir To.

Good night, Penthesilea.  Craig1916: 196

Sir And.

Before me, she’s a good wench.

Sir To.

She’s a beagle, true-bred, and one that adores me: what o’ that?

Sir And.

I was adored once too.  Craig1916: 200

Sir To.

Let’s to bed, knight. Thou hadst need send for more money.

Sir And.

If I cannot recover your niece, I am a foul way out.  Craig1916: 204

Sir To.

Send for money, knight: if thou hast her not i’ the end, call me cut.

Sir And.

If I do not, never trust me, take it how you will.  Craig1916: 208

Sir To.

Come, come: I’ll go burn some sack; ’tis too late to go to bed now. Come, knight; come, knight.

[ Exeunt.

SCENE IV.—: A Room in the DUKE’S Palace.

Enter DUKE, VIOLA, CURIO, and Others.

Duke.

Give me some music. Now, good morrow, friends:

Now, good Cesario, but that piece of song,

That old and antique song we heard last night;

Methought it did relieve my passion much,  Craig1916: 4

More than light airs and recollected terms

Of these most brisk and giddy-paced times:

Come; but one verse.

Cur.

He is not here, so please your lordship, that should sing it.  Craig1916: 9

Duke.

Who was it?

Cur.

Feste, the jester, my lord; a fool that the Lady Olivia’s father took much delight in. He is about the house.  Craig1916: 13

Duke.

Seek him out, and play the tune the while.

[ Exit CURIO. Music.

Come hither, boy: if ever thou shalt love,

In the sweet pangs of it remember me;  Craig1916: 16

For such as I am all true lovers are:

Unstaid and skittish in all motions else

Save in the constant image of the creature

That is belov’d. How dost thou like this tune?  Craig1916: 20

Vio.

It gives a very echo to the seat

Where love is thron’d.

Duke.

Thou dost speak masterly.

My life upon’t, young though thou art, thine eye

Hath stay’d upon some favour that it loves;  Craig1916: 24

Hath it not, boy?

Vio.

A little, by your favour.

Duke.

What kind of woman is’t?

Vio.

Of your complexion.

Duke.

She is not worth thee, then. What years, i’ faith?

Vio.

About your years, my lord.  Craig1916: 28

Duke.

Too old, by heaven. Let still the woman take

An elder than herself, so wears she to him,

So sways she level in her husband’s heart:

For, boy, however we do praise ourselves,  Craig1916: 32

Our fancies are more giddy and unfirm,

More longing, wavering, sooner lost and worn,

Than women’s are.

Vio.

I think it well, my lord.

Duke.

Then, let thy love be younger than thyself,  Craig1916: 36

Or thy affection cannot hold the bent;

For women are as roses, whose fair flower

Being once display’d, doth fall that very hour.

Vio.

And so they are: alas, that they are so;  Craig1916: 40

To die, even when they to perfection grow!

Re-enter CURIO with Clown.

Duke.

O, fellow! come, the song we had last night.

Mark it, Cesario; it is old and plain;

The spinsters and the knitters in the sun,  Craig1916: 44

And the free maids that weave their thread with bones,

Do use to chant it: it is silly sooth,

And dallies with the innocence of love,

Like the old age.  Craig1916: 48

Clo.

Are you ready, sir?

Duke.

Ay; prithee, sing.

[ Music.

Clo.

- Come away, come away, death,

- And in sad cypress let me be laid;  Craig1916: 52

- Fly away, fly away, breath;

- I am slain by a fair cruel maid.

- My shroud of white, stuck all with yew,

- O! prepare it  Craig1916: 56

- My part of death, no one so true

- Did share it.

- Not a flower, not a flower sweet,

- On my black coffin let there be strown,  Craig1916: 60

- Not a friend, not a friend greet

- My poor corse, where my bones shall be thrown.

- A thousand thousand sighs to save,

- Lay me, O! where  Craig1916: 64

- Sad true lover never find my grave,

- To weep there.

Duke.

There’s for thy pains.

Clo.

No pains, sir; I take pleasure in singing, sir.  Craig1916: 69

Duke.

I’ll pay thy pleasure then.

Clo.

Truly, sir, and pleasure will be paid, one time or another.  Craig1916: 72

Duke.

Give me now leave to leave thee.

Clo.

Now, the melancholy god protect thee, and the tailor make thy doublet of changeable taffeta, for thy mind is a very opal! I would have men of such constancy put to sea, that their business might be everything and their intent everywhere; for that’s it that always makes a good voyage of nothing. Farewell.

[ Exit.

Duke.

Let all the rest give place.

[ Exeunt CURIO and Attendants.

Once more, Cesario,  Craig1916: 81

Get thee to yond same sovereign cruelty:

Tell her, my love, more noble than the world,

Prizes not quantity of dirty lands;  Craig1916: 84

The parts that fortune hath bestow’d upon her,

Tell her, I hold as giddily as fortune;

But ’tis that miracle and queen of gems

That nature pranks her in attracts my soul.  Craig1916: 88

Vio.

But if she cannot love you, sir?

Duke.

I cannot be so answer’d.

Vio.

Sooth, but you must.

Say that some lady, as perhaps, there is,

Hath for your love as great a pang of heart  Craig1916: 92

As you have for Olivia: you cannot love her;

You tell her so; must she not then be answer’d?

Duke.

There is no woman’s sides

Can bide the beating of so strong a passion  Craig1916: 96

As love doth give my heart; no woman’s heart

So big, to hold so much; they lack retention.

Alas! their love may be call’d appetite,

No motion of the liver, but the palate,  Craig1916: 100

That suffer surfeit, cloyment, and revolt;

But mine is all as hungry as the sea,

And can digest as much. Make no compare

Between that love a woman can bear me  Craig1916: 104

And that I owe Olivia.

Vio.

Ay, but I know,—

Duke.

What dost thou know?

Vio.

Too well what love women to men may owe:

In faith, they are as true of heart as we.  Craig1916: 108

My father had a daughter lov’d a man,

As it might be, perhaps, were I a woman,

I should your lordship.

Duke.

And what’s her history?

Vio.

A blank, my lord. She never told her love,  Craig1916: 112

But let concealment, like a worm i’ the bud,

Feed on her damask cheek: she pin’d in thought,

And with a green and yellow melancholy,

She sat like Patience on a monument,  Craig1916: 116

Smiling at grief. Was not this love indeed?

We men may say more, swear more; but indeed

Our shows are more than will, for still we prove

Much in our vows, but little in our love.  Craig1916: 120

Duke.

But died thy sister of her love, my boy?

Vio.

I am all the daughters of my father’s house,

And all the brothers too; and yet I know not.

Sir, shall I to this lady?

Duke.

Ay, that’s the theme.  Craig1916: 124

To her in haste; give her this jewel; say

My love can give no place, bide no denay.

[ Exeunt.

SCENE V.—: OLIVIA’S Garden.

Enter SIR TOBY BELCH, SIR ANDREW AGUECHEEK, and FABIAN.

Sir To.

Come thy ways, Signior Fabian.

Fab

Nay, I’ll come: if I lose a scruple of this sport, let me be boiled to death with melancholy.  Craig1916: 4

Sir To.

Wouldst thou not be glad to have the niggardly rascally sheep-biter come by some notable shame?

Fab.

I would exult, man: you know he brought me out o’ favour with my lady about a bear-baiting here.  Craig1916: 10

Sir To.

To anger him we’ll have the bear again; and we will fool him black and blue; shall we not, Sir Andrew?  Craig1916: 13

Sir And.

An we do not, it is pity of our lives.

Sir To.

Here comes the little villain.  Craig1916: 16

Enter MARIA.

How now, my metal of India!

Mar.

Get ye all three into the box-tree. Malvolio’s coming down this walk: he has been yonder i’ the sun practising behaviour to his own shadow this half-hour. Observe him, for the love of mockery; for I know this letter will make a contemplative idiot of him. Close, in the name of jesting! Lie thou there: [ Throws down a letter. ] for here comes the trout that must be caught with tickling.

[ Exit.

Enter MALVOLIO.

Mal.

’Tis but fortune; all is fortune. Maria once told me she did affect me; and I have heard herself come thus near, that should she fancy, it should be one of my complexion. Besides, she uses me with a more exalted respect than anyone else that follows her. What should I think on’t?  Craig1916: 33

Sir To.

Here’s an over-weening rogue!

Fab.

O, peace! Contemplation makes a rare turkey-cock of him: how he jets under his advanced plumes!  Craig1916: 37

Sir And.

’Slight, I could so beat the rogue!

Sir To.

Peace! I say.

Mal.

To be Count Malvolio!  Craig1916: 40

Sir To.

Ah, rogue!

Sir And.

Pistol him, pistol him.

Sir To.

Peace! peace!

Mal.

There is example for’t: the lady of the Strachy married the yeoman of the wardrobe.

Sir And.

Fie on him, Jezebel!

Fab.

O, peace! now he’s deeply in; look how imagination blows him.  Craig1916: 49

Mal.

Having been three months married to her, sitting in my state,—

Sir To.

O! for a stone-bow, to hit him in the eye!  Craig1916: 53

Mal.

Calling my officers about me, in my branched velvet gown; having come from a daybed, where I have left Olivia sleeping,—  Craig1916: 56

Sir To.

Fire and brimstone!

Fab.

O, peace! peace!

Mal.

And then to have the humour of state: and after a demure travel of regard, telling them I know my place, as I would they should do theirs, to ask for my kinsman Toby,—

Sir To.

Bolts and shackles!

Fab.

O, peace, peace, peace! now, now.  Craig1916: 64

Mal.

Seven of my people, with an obedient start, make out for him. I frown the while; and perchance wind up my watch, or play with my—some rich jewel. Toby approaches; curtsies there to me,—  Craig1916: 69

Sir To.

Shall this fellow live?

Fab.

Though our silence be drawn from us with cars, yet peace!  Craig1916: 72

Mal.

I extend my hand to him thus, quenching my familiar smile with an austere regard of control,—

Sir To.

And does not Toby take you a blow o’ the lips then?  Craig1916: 76

Mal.

Saying, ‘Cousin Toby, my fortunes having cast me on your niece give me this prerogative of speech,’—

Sir To.

What, what?  Craig1916: 80

Mal.

‘You must amend your drunkenness.’

Sir To.

Out, scab!

Fab.

Nay, patience, or we break the sinews of our plot.  Craig1916: 84

Mal.

‘Besides, you waste the treasure of your time with a foolish knight,’—

Sir And.

That’s me, I warrant you.

Mal.

‘One Sir Andrew,’—  Craig1916: 88

Sir And.

I knew ’twas I; for many do call me fool.

Mal.

[ Seeing the letter. ] What employment have we here?  Craig1916: 92

Fab.

Now is the woodcock near the gin.

Sir To.

O, peace! and the spirit of humours intimate reading aloud to him!

Mal.

[ Taking up the letter. ] By my life, this is my lady’s hand! these be her very C’s, her U’s, and her T’s; and thus makes she her great P’s. It is, in contempt of question, her hand.

Sir And.

Her C’s, her U’s, and her T’s: why that—  Craig1916: 101

Mal.

[ Reads. ] To the unknown beloved, this and my good wishes: her very phrases! By your leave, wax. Soft! and the impressure her Lucrece, with which she uses to seal: ’tis my lady. To whom should this be?

Fab.

This wins him, liver and all.

Mal.

- Jove knows I love;  Craig1916: 108

- But who?

- Lips, do not move

- No man must know.

‘No man must know.’ What follows? the numbers altered! ‘No man must know:’ if this should be thee, Malvolio!

Sir To.

Marry, hang thee, brock!

Mal.

- I may command where I adore;  Craig1916: 116

- But silence, like a Lucrece knife,

- With bloodless stroke my heart doth gore:

- M, O, A, I, doth sway my life.

Fab.

A fustian riddle!  Craig1916: 120

Sir To.

Excellent wench, say I.

Mal.

‘M, O, A, I, doth sway my life.’ Nay, but first, let me see, let me see, let me see.

Fab.

What dish o’ poison has she dressed him!  Craig1916: 125

Sir To.

And with what wing the staniel checks at it!

Mal.

‘I may command where I adore.’ Why, she may command me: I serve her; she is my lady. Why, this is evident to any formal capacity; there is no obstruction in this. And the end, what should that alphabetical position portend? if I could make that resemble something in me,—Softly!—M, O, A, I,—

Sir To.

O! ay, make up that: he is now at a cold scent.  Craig1916: 136

Fab.

Sowter will cry upon ’t, for all this, though it be as rank as a fox.

Mal.

M, Malvolio; M, why, that begins my name.  Craig1916: 140

Fab.

Did not I say he would work it out? the cur is excellent at faults.

Mal.

M,—But then there is no consonancy in the sequel; that suffers under probation: A should follow, but O does.  Craig1916: 145

Fab.

And O shall end, I hope.

Sir To.

Ay, or I’ll cudgel him, and make him cry, O!  Craig1916: 148

Mal.

And then I comes behind.

Fab.

Ay, an you had any eye behind you, you might see more detraction at your heels than fortunes before you.  Craig1916: 152

Mal.

M, O, A, I; this simulation is not as the former; and yet, to crush this a little, it would bow to me, for every one of these letters are in my name. Soft! here follows prose.  Craig1916: 156

If this fall into thy hand, revolve. In my stars I am above thee; but be not afraid of greatness: some are born great, some achieve greatness, and some have greatness thrust upon them. Thy Fates open their hands; let thy blood and spirit embrace them; and to inure thyself to what thou art like to be, cast thy humble slough, and appear fresh. Be opposite with a kinsman, surly with servants; let thy tongue tang arguments of state; put thyself into the trick of singularity She thus advises thee that sighs for thee. Remember who commended thy yellow stockings, and wished to see thee ever cross-gartered: I say, remember. Go to, thou art made, if thou desirest to be so; if not, let me see thee a steward still, the fellow of servants, and not worthy to touch Fortune’s fingers. Farewell. She that would alter services with thee.  Craig1916: 173

THE FORTUNATE-UNHAPPY.

Daylight and champian discovers not more: this is open. I will be proud, I will read politic authors, I will baffle Sir Toby, I will wash off gross acquaintance, I will be point-devise the very man. I do not now fool myself, to let imagination jade me, for every reason excites to this, that my lady loves me. She did commend my yellow stockings of late, she did praise my leg being cross-gartered; and in this she manifests herself to my love, and, with a kind of injunction drives me to these habits of her liking. I thank my stars I am happy. I will be strange, stout, in yellow stockings, and cross-gartered, even with the swiftness of putting on. Jove and my stars be praised! Here is yet a postscript.  Craig1916: 190

Thou canst not choose but know who I am. If thou entertainest my love, let it appear in thy smiling; thy smiles become thee well; therefore in my presence still smile, dear my sweet, I prithee.

Jove, I thank thee. I will smile: I will do everything that thou wilt have me.

[ Exit.

Fab.

I will not give my part of this sport for a pension of thousands to be paid from the Sophy.

Sir To.

I could marry this wench for this device.  Craig1916: 201

Sir And.

So could I too.

Sir To.

And ask no other dowry with her but such another jest.  Craig1916: 204

Sir And.

Nor I neither.

Fab.

Here comes my noble gull-catcher.

Re-enter MARIA.

Sir To.

Wilt thou set thy foot o’ my neck?

Sir And.

Or o’ mine either?  Craig1916: 208

Sir To.

Shall I play my freedom at tray-trip, and become thy bond-slave?

Sir And.

I’ faith, or I either?

Sir To.

Why, thou hast put him in such a dream, that when the image of it leaves him he must run mad.

Mar.

Nay, but say true; does it work upon him?  Craig1916: 216

Sir To.

Like aqua-vitæ with a midwife.

Mar.

If you will, then see the fruits of the sport, mark his first approach before my lady; he will come to her in yellow stockings, and ’tis a colour she abhors; and cross-gartered, a fashion she detests; and he will smile upon her, which will now be so unsuitable to her disposition, being addicted to a melancholy as she is, that it cannot but turn him into a notable contempt. If you will see it, follow me.

Sir To.

To the gates of Tartar, thou most excellent devil of wit!  Craig1916: 228

Sir And.

I’ll make one too.

[ Exeunt.

ACT III.

SCENE I.—: OLIVIA’S Garden.

Enter VIOLA, and Clown with a tabor.

Vio.

Save thee, friend, and thy music. Dost thou live by thy tabor?

Clo.

No, sir, I live by the church.

Vio.

Art thou a churchman?  Craig1916: 4

Clo.

No such matter, sir: I do live by the church; for I do live at my house, and my house doth stand by the church.

Vio.

So thou mayst say, the king lies by a beggar, if a beggar dwell near him; or, the church stands by thy tabor, if thy tabor stand by the church.  Craig1916: 11

Clo.

You have said, sir. To see this age!

A sentence is but a cheveril glove to a good wit: how quickly the wrong side may be turned outward!  Craig1916: 15

Vio.

Nay, that’s certain: they that dally nicely with words may quickly make them wanton.

Clo.

I would therefore my sister had had no name, sir.  Craig1916: 20

Vio.

Why, man?

Clo.

Why, sir, her name’s a word; and to dally with that word might make my sister wanton. But indeed, words are very rascals since bonds disgraced them.  Craig1916: 25

Vio.

Thy reason, man?

Clo.

Troth, sir, I can yield you none without words; and words are grown so false, I am loath to prove reason with them.  Craig1916: 29

Vio.

I warrant thou art a merry fellow, and carest for nothing.

Clo.

Not so, sir, I do care for something; but in my conscience, sir, I do not care for you: if that be to care for nothing, sir, I would it would make you invisible.

Vio.

Art not thou the Lady Olivia’s fool?  Craig1916: 36

Clo.

No, indeed, sir; the Lady Olivia has no folly: she will keep no fool, sir, till she be married; and fools are as like husbands as pilchards are to herrings—the husband’s the bigger. I am indeed not her fool, but her corrupter of words.

Vio.

I saw thee late at the Count Orsino’s.  Craig1916: 43

Clo.

Foolery, sir, does walk about the orb like the sun; it shines every where. I would be sorry, sir, but the fool should be as oft with your master as with my mistress. I think I saw your wisdom there.  Craig1916: 48

Vio.

Nay, an thou pass upon me, I’ll no more with thee. Hold, there’s sixpence for thee.

[ Gives a piece of money.

Clo.

Now Jove, in his next commodity of hair, send thee a beard!  Craig1916: 52

Vio.

By my troth, I’ll tell thee, I am almost sick for one, though I would not have it grow on my chin. Is thy lady within?

Clo.

[ Pointing to the coin. ] Would not a pair of these have bred, sir?  Craig1916: 57

Vio.

Yes, being kept together and put to use.

Clo.

I would play Lord Pandarus of Phrygia, sir, to bring a Cressida to this Troilus.  Craig1916: 60

Vio.

I understand you, sir; ’tis well begg’d.

Clo.

The matter, I hope, is not great, sir, begging but a beggar: Cressida was a beggar. My lady is within, sir. I will conster to them whence you come; who you are and what you would are out of my welkin; I might say ‘element,’ but the word is overworn.

[ Exit.

Vio.

This fellow’s wise enough to play the fool,  Craig1916: 68

And to do that well craves a kind of wit:

He must observe their mood on whom he jests,

The quality of persons, and the time,

And, like the haggard, check at every feather

That comes before his eye. This is a practice

As full of labour as a wise man’s art;  Craig1916: 74

For folly that he wisely shows is fit;

But wise men folly-fall’n, quite taint their wit.

Enter SIR TOBY BELCH and SIR ANDREW AGUECHEEK.

Sir To.

Save you, gentleman.

Vio.

And you, sir.

Sir And.

Dieu vous garde, monsieur.

Vio.

Et vous aussi; votre serviteur.  Craig1916: 80

Sir And.

I hope, sir, you are; and I am yours.

Sir To.

Will you encounter the house? my niece is desirous you should enter, if your trade be to her.  Craig1916: 85

Vio.

I am bound to your niece, sir: I mean, she is the list of my voyage.

Sir To.

Taste your legs, sir: put them to motion.  Craig1916: 89

Vio.

My legs do better understand me, sir, than I understand what you mean by bidding me taste my legs.  Craig1916: 92

Sir To.

I mean, to go, sir, to enter.

Vio.

I will answer you with gait and entrance. But we are prevented.

Enter OLIVIA and MARIA.

Most excellent accomplished lady, the heavens rain odours on you!  Craig1916: 97

Sir And.

That youth’s a rare courtier. ‘Rain odours!’ well.

Vio.

My matter hath no voice, lady, but to your own most pregnant and vouchsafed ear.  Craig1916: 101

Sir And.

‘Odours,’ ‘pregnant,’ and ‘vouchsafed.’ I’ll get ’em all three all ready.

Oli.

Let the garden door be shut, and leave me to my hearing.  Craig1916: 105

[ Exeunt SIR TOBY, SIR ANDREW, and MARIA.

Give me your hand, sir.

Vio.

My duty, madam, and most humble service.

Oli.

What is your name?  Craig1916: 108

Vio.

Cesario is your servant’s name, fair princess.

Oli.

My servant, sir! ’Twas never merry world

Since lowly feigning was call’d compliment.

You’re servant to the Count Orsino, youth.  Craig1916: 112

Vio.

And he is yours, and his must needs be yours:

Your servant’s servant is your servant, madam.

Oli.

For him, I think not on him: for his thoughts,

Would they were blanks rather than fill’d with me!  Craig1916: 116

Vio.

Madam, I come to whet your gentle thoughts

On his behalf.

Oli.

O! by your leave, I pray you,

I bade you never speak again of him:

But, would you undertake another suit,  Craig1916: 120

I had rather hear you to solicit that

Than music from the spheres.

Vio.

Dear lady,—

Oli

Give me leave, beseech you. I did send,

After the last enchantment you did here,  Craig1916: 125

A ring in chase of you: so did I abuse

Myself, my servant, and, I fear me, you:

Under your hard construction must I sit,  Craig1916: 128

To force that on you, in a shameful cunning,

Which you knew none of yours: what might you think?

Have you not set mine honour at the stake,

And baited it with all th’ unmuzzled thoughts

That tyrannous heart can think? To one of your receiving  Craig1916: 133

Enough is shown; a cypress, not a bosom,

Hideth my heart. So, let me hear you speak.

Vio.

I pity you.  Craig1916: 136

Oli.

That’s a degree to love.

Vio.

No, not a grize; for ’tis a vulgar proof

That very oft we pity enemies.

Oli.

Why, then methinks ’tis time to smile again.  Craig1916: 140

O world! how apt the poor are to be proud.

If one should be a prey, how much the better

To fall before the lion than the wolf!

[ Clock strikes.

The clock upbraids me with the waste of time.

Be not afraid, good youth, I will not have you:

And yet, when wit and youth is come to harvest,

Your wife is like to reap a proper man:

There lies your way, due west.

Vio.

Then westward-ho!  Craig1916: 148

Grace and good disposition attend your ladyship!

You’ll nothing, madam, to my lord by me?

Oli.

Stay:

I prithee, tell me what thou think’st of me.  Craig1916: 152

Vio.

That you do think you are not what you are.

Oli.

If I think so, I think the same of you.

Vio.

Then think you right: I am not what I am.

Oli.

I would you were as I would have you be!  Craig1916: 156

Vio.

Would it be better, madam, than I am?

I wish it might, for now I am your fool.

Oli.

O! what a deal of scorn looks beautiful

In the contempt and anger of his lip.  Craig1916: 160

A murderous guilt shows not itself more soon

Than love that would seem hid; love’s night is noon.

Cesario, by the roses of the spring,

By maidhood, honour, truth, and every thing,

I love thee so, that, maugre all thy pride,  Craig1916: 165

Nor wit nor reason can my passion hide.

Do not extort thy reasons from this clause,

For that I woo, thou therefore hast no cause;

But rather reason thus with reason fetter,  Craig1916: 169

Love sought is good, but giv’n unsought is better.

Vio.

By innocence I swear, and by my youth,

I have one heart, one bosom, and one truth,  Craig1916: 172

And that no woman has; nor never none

Shall mistress be of it, save I alone.

And so adieu, good madam: never more

Will I my master’s tears to you deplore.  Craig1916: 176

Oli.

Yet come again, for thou perhaps mayst move

That heart, which now abhors, to like his love.

[ Exeunt.

SCENE II.—: A Room in OLIVIA’S House.

Enter SIR TOBY BELCH, SIR ANDREW AGUECHEEK, and FABIAN.

Sir And.

No, faith, I’ll not stay a jot longer.

Sir To.

Thy reason, dear venom; give thy reason.

Fab.

You must needs yield your reason, Sir Andrew.  Craig1916: 5

Sir And.

Marry, I saw your niece do more favours to the count’s serving-man than ever she bestowed upon me; I saw’t i’ the orchard.  Craig1916: 8

Sir To.

Did she see thee the while, old boy? tell me that.

Sir And.

As plain as I see you now.

Fab.

This was a great argument of love in her toward you.  Craig1916: 13

Sir And.

’Slight! will you make an ass o’ me?

Fab.

I will prove it legitimate, sir, upon the oaths of judgment and reason.  Craig1916: 17

Sir To.

And they have been grand-jurymen since before Noah was a sailor.

Fab.

She did show favour to the youth in your sight only to exasperate you, to awake your dormouse valour, to put fire in your heart, and brimstone in your liver. You should then have accosted her, and with some excellent jests, firenew from the mint, you should have banged the youth into dumbness. This was looked for at your hand, and this was balked: the double gilt of this opportunity you let time wash off, and you are now sailed into the north of my lady’s opinion; where you will hang like an icicle on a Dutchman’s beard, unless you do redeem it by some laudable attempt, either of valour or policy.  Craig1916: 33

Sir And.

An’t be any way, it must be with valour, for policy I hate: I had as lief be a Brownist as a politician.  Craig1916: 36

Sir To.

Why, then, build me thy fortunes upon the basis of valour: challenge me the count’s youth to fight with him; hurt him in eleven places: my niece shall take note of it; and assure thyself, there is no love-broker in the world can more prevail in man’s commendation with woman than report of valour.

Fab.

There is no way but this, Sir Andrew.  Craig1916: 44

Sir And.

Will either of you bear me a challenge to him?

Sir To.

Go, write it in a martial hand; be curst and brief; it is no matter how witty, so it be eloquent, and full of invention: taunt him with the licence of ink: if thou thou’st him some thrice, it shall not be amiss; and as many lies as will lie in thy sheet of paper, although the sheet were big enough for the bed of Ware in England, set ’em down: go, about it. Let there be gall enough in thy ink, though thou write with a goose-pen, no matter: about it.  Craig1916: 56

Sir And.

Where shall I find you?

Sir To.

We’ll call thee at the cubiculo: go.

[ Exit SIR ANDREW.

Fab.

This is a dear manakin to you, Sir Toby.  Craig1916: 60

Sir To.

I have been dear to him, lad, some two thousand strong, or so.

Fab.

We shall have a rare letter from him; but you’ll not deliver it.  Craig1916: 64

Sir To.

Never trust me, then; and by all means stir on the youth to an answer. I think oxen and wainropes cannot hale them together. For Andrew, if he were opened, and you find so much blood in his liver as will clog the foot of a flea, I’ll eat the rest of the anatomy.

Fab.

And his opposite, the youth, bears in his visage no great presage of cruelty.  Craig1916: 72

Sir To.

Look, where the youngest wren of nine comes.

Enter MARIA.

Mar.

If you desire the spleen, and will laugh yourselves into stitches, follow me. Yond gull Malvolio is turned heathen, a very renegado; for there is no Christian, that means to be saved by believing rightly, can ever believe such impossible passages of grossness. He’s in yellow stockings.  Craig1916: 81

Sir To.

And cross-gartered?

Mar.

Most villanously; like a pedant that keeps a school i’ the church. I have dogged him like his murderer. He does obey every point of the letter that I dropped to betray him: he does smile his face into more lines than are in the new map with the augmentation of the Indies. You have not seen such a thing as ’tis; I can hardly forbear hurling things at him. I know my lady will strike him: if she do, he’ll smile and take’t for a great favour.  Craig1916: 92

Sir To.

Come, bring us, bring us where he is.

[ Exeunt.

SCENE III.—: A Street.

Enter SEBASTIAN and ANTONIO.

Seb.

I would not by my will have troubled you;

But since you make your pleasure of your pains,

I will no further chide you.

Ant.

I could not stay behind you: my desire,

More sharp than filed steel, did spur me forth;  Craig1916: 5

And not all love to see you,—though so much

As might have drawn one to a longer voyage,—

But jealousy what might befall your travel,  Craig1916: 8

Being skilless in these parts; which to a stranger,

Unguided and unfriended, often prove

Rough and unhospitable: my willing love,

The rather by these arguments of fear,  Craig1916: 12

Set forth in your pursuit.

Seb.

My kind Antonio,

I can no other answer make but thanks,

And thanks, and ever thanks; for oft good turns

Are shuffled off with such uncurrent pay:  Craig1916: 16

But, were my worth, as is my conscience, firm,

You should find better dealing. What’s to do?

Shall we go see the reliques of this town?

Ant.

To-morrow, sir: best first go see your lodging.  Craig1916: 20

Seb.

I am not weary, and ’tis long to night:

I pray you, let us satisfy our eyes

With the memorials and the things of fame

That do renown this city.

Ant.

Would you’d pardon me;

I do not without danger walk these streets:  Craig1916: 25

Once, in a sea-fight ’gainst the Count his galleys,

I did some service; of such note indeed,

That were I ta’en here it would scarce be answer’d.  Craig1916: 28

Seb.

Belike you slew great number of his people?

Ant.

The offence is not of such a bloody nature,

Albeit the quality of the time and quarrel

Might well have given us bloody argument.  Craig1916: 32

It might have since been answer’d in repaying

What we took from them; which, for traffic’s sake,

Most of our city did: only myself stood out;

For which, if I be lapsed in this place,  Craig1916: 36

I shall pay dear.

Seb.

Do not then walk too open.

Ant.

It doth not fit me. Hold, sir; here’s my purse.

In the south suburbs, at the Elephant,

Is best to lodge: I will bespeak our diet,  Craig1916: 40

Whiles you beguile the time and feed your knowledge

With viewing of the town: there shall you have me.

Seb.

Why I your purse?

Ant.

Haply your eye shall light upon some toy  Craig1916: 44

You have desire to purchase; and your store,

I think, is not for idle markets, sir.

Seb.

I’ll be your purse-bearer and leave you for an hour.  Craig1916: 48

Ant.

To the Elephant.

Seb.

I do remember.

[ Exeunt.

SCENE IV.—: OLIVIA’S Garden.

Enter OLIVIA and MARIA.

Oli.

I have sent after him: he says he’ll come;

How shall I feast him? what bestow of him?

For youth is bought more oft than begg’d or borrow’d.

I speak too loud.  Craig1916: 4

Where is Malvolio? he is sad, and civil,

And suits well for a servant with my fortunes:

Where is Malvolio?

Mar.

He’s coming, madam; but in very strange manner. He is sure possess’d, madam.  Craig1916: 9

Oli.

Why, what’s the matter? does he rave?

Mar.

No, madam; he does nothing but smile: your ladyship were best to have some guard about you if he come, for sure the man is tainted in’s wits.

Oli.

Go call him hither.

[ Exit MARIA.

I am as mad as he,  Craig1916: 16

If sad and merry madness equal be.

Re-enter MARIA, with MALVOLIO.

How now, Malvolio!

Mal.

Sweet lady, ho, ho.

Oli.

Smil’st thou?  Craig1916: 20

I sent for thee upon a sad occasion.

Mal.

Sad, lady! I could be sad: this does make some obstruction in the blood, this crossgartering; but what of that? if it please the eye of one, it is with me as the very true sonnet is, ‘Please one and please all.’

Oli.

Why, how dost thou, man? what is the matter with thee?  Craig1916: 28

Mal.

Not black in my mind, though yellow in my legs. It did come to his hands, and commands shall be executed: I think we do know the sweet Roman hand.  Craig1916: 32

Oli.

Wilt thou go to bed, Malvolio?

Mal.

To bed! ay, sweetheart; and I’ll come to thee.

Oli.

God comfort thee! Why dost thou smile so and kiss thy hand so oft?  Craig1916: 37

Mar.

How do you, Malvolio?

Mal.

At your request! Yes; nightingales answer daws.  Craig1916: 40

Mar.

Why appear you with this ridiculous boldness before my lady?

Mal.

‘Be not afraid of greatness:’ ’Twas well writ.

Oli.

What meanest thou by that, Malvolio?

Mal.

‘Some are born great,’—

Oli.

Ha!

Mal.

‘Some achieve greatness,’—  Craig1916: 48

Oli.

What sayst thou?

Mal.

‘And some have greatness thrust upon them.’

Oli.

Heaven restore thee!  Craig1916: 52

Mal.

‘Remember who commended thy yellow stockings,’—

Oli.

Thy yellow stockings!

Mal.

‘And wished to see thee cross-gartered.’

Oli.

Cross-gartered!  Craig1916: 57

Mal.

‘Go to, thou art made, if thou desirest to be so,’—

Oli.

Am I made?  Craig1916: 60

Mal.

‘If not, let me see thee a servant still.’

Oli.

Why, this is very midsummer madness.

Enter Servant.

Ser.

Madam, the young gentleman of the Count Orsino’s is returned. I could hardly entreat him back: he attends your ladyship’s pleasure.  Craig1916: 66

Oli.

I’ll come to him. [ Exit Servant.] Good Maria, let this fellow be looked to. Where’s my cousin Toby? Let some of my people have a special care of him: I would not have him miscarry for the half of my dowry.  Craig1916: 71

[ Exeunt OLIVIA and MARIA.

Mal.

Oh, ho! do you come near me now? no worse man than Sir Toby to look to me! This concurs directly with the letter: she sends him on purpose, that I may appear stubborn to him; for she incites me to that in the letter. ‘Cast thy humble slough,’ says she; ‘be opposite with a kinsman, surly with servants; let thy tongue tang with arguments of state; put thyself into the trick of singularity;’ and consequently sets down the manner how; as, a sad face, a reverend carriage, a slow tongue, in the habit of some sir of note, and so forth. I have limed her; but it is Jove’s doing, and Jove make me thankful! And when she went away now, ‘Let this fellow be looked to;’ fellow! not Malvolio, nor after my degree, but fellow. Why, everything adheres together, that no dram of a scruple, no scruple of a scruple, no obstacle, no incredulous or unsafe circumstance—What can be said? Nothing that can be can come between me and the full prospect of my hopes. Well, Jove, not I, is the doer of this, and he is to be thanked.  Craig1916: 94

Re-enter MARIA, with SIR TOBY BELCH and FABIAN.

Sir To.

Which way is he, in the name of sanctity? If all the devils in hell be drawn in little, and Legion himself possess’d him, yet I’ll speak to him.

Fab.

Here he is, here he is. How is’t with you, sir? how is’t with you, man?  Craig1916: 100

Mal.

Go off; I discard you: let me enjoy my private; go off.

Mar.

Lo, how hollow the fiend speaks within him! did not I tell you? Sir Toby, my lady prays you to have a care of him.  Craig1916: 105

Mal.

Ah, ha! does she so?

Sir To.

Go to, go to: peace! peace! we must deal gently with him; let me alone. How do you, Malvolio? how is’t with you? What, man! defy the devil: consider, he’s an enemy to mankind.

Mal.

Do you know what you say?  Craig1916: 112

Mar.

La you! an you speak ill of the devil, how he takes it at heart. Pray God, he be not bewitched!

Fab.

Carry his water to the wise-woman.  Craig1916: 116

Mar.

Marry, and it shall be done to-morrow morning, if I live. My lady would not lose him for more than I’ll say.

Mal.

How now, mistress!  Craig1916: 120

Mar.

O Lord!

Sir To.

Prithee, hold thy peace; this is not the way: do you not see you move him? let me alone with him.  Craig1916: 124

Fab.

No way but gentleness; gently, gently: the fiend is rough, and will not be roughly used.

Sir To.

Why, how now, my bawcock! how dost thou, chuck?  Craig1916: 128

Mal.

Sir!

Sir To.

Ay, Biddy, come with me. What, man! ’tis not for gravity to play at cherry-pit with Satan: hang him, foul collier!  Craig1916: 132

Mar.

Get him to say his prayers, good Sir Toby, get him to pray.

Mal.

My prayers, minx!

Mar.

No, I warrant you, he will not hear of godliness.  Craig1916: 137

Mal.

Go, hang yourselves all! you are idle shallow things: I am not of your element. You shall know more hereafter.

[ Exit.

Sir To.

Is’t possible?  Craig1916: 141

Fab.

If this were played upon a stage now, I could condemn it as an improbable fiction.

Sir To.

His very genius hath taken the infection of the device, man.  Craig1916: 145

Mar.

Nay, pursue him now, lest the device take air, and taint.

Fab.

Why, we shall make him mad indeed.

Mar.

The house will be the quieter.  Craig1916: 149

Sir To.

Come, we’ll have him in a dark room, and bound. My niece is already in the belief that he’s mad: we may carry it thus, for our pleasure and his penance, till our very pastime, tired out of breath, prompt us to have mercy on him; at which time we will bring the device to the bar, and crown thee for a finder of madmen. But see, but see.  Craig1916: 157

Enter SIR ANDREW AGUECHEEK.

Fab.

More matter for a May morning.

Sir And.

Here’s the challenge; read it: I warrant there’s vinegar and pepper in’t.  Craig1916: 160

Fab.

Is’t so saucy?

Sir And.

Ay, is’t, I warrant him: do but read.

Sir To.

Give me. Youth, whatsoever thou art, thou art but a scurvy fellow.  Craig1916: 165

Fab.

Good, and valiant.

Sir To.

Wonder not, nor admire not in thy mind, why I do call thee so, for I will show thee no reason for’t,  Craig1916: 169

Fab.

A good note, that keeps you from the blow of the law.

Sir To.

Thou comest to the Lady Olivia, and in my sight she uses thee kindly: but thou liest in thy throat; that is not the matter I challenge thee for.

Fab.

Very brief, and to exceeding good sense—less.  Craig1916: 177

Sir To.

I will waylay thee going home; where, if it be thy chance to kill me, —

Fab.

Good.  Craig1916: 180

Sir To.

Thou killest me like a rogue and a villain.

Fab.

Still you keep o’ the windy side of the law: good.  Craig1916: 184

Sir To.

Fare thee well; and God have mercy upon one of our souls! He may have mercy upon mine, but my hope is better; and so look to thyself. Thy friend, as thou usest him, and thy sworn enemy,

ANDREW AGUECHEEK.

If this letter move him not, his legs cannot.

I’ll give’t him.  Craig1916: 192

Mar.

You may have very fit occasion for for’t: he is now in some commerce with my lady, and will by and by depart.  Craig1916: 195

Sir To.

Go, Sir Andrew; scout me for him at the corner of the orchard like a bum-baily: so soon as ever thou seest him, draw; and, as thou drawest, swear horrible; for it comes to pass oft that a terrible oath, with a swaggering accent sharply twanged off, gives manhood more approbation than ever proof itself would have earned him. Away!

Sir And.

Nay, let me alone for swearing.  Craig1916: 204

[ Exit.

Sir To.

Now will not I deliver his letter: for the behaviour of the young gentleman gives him out to be of good capacity and breeding; his employment between his lord and my niece confirms no less: therefore this letter, being so excellently ignorant, will breed no terror in the youth: he will find it comes from a clodpole. But, sir, I will deliver his challenge by word of mouth; set upon Aguecheek a notable report of valour; and drive the gentleman,—as I know his youth will aptly receive it,—into a most hideous opinion of his rage, skill, fury, and impetuosity. This will so fright them both that they will kill one another by the look, like cockatrices.  Craig1916: 219

Fab.

Here he comes with your niece: give them way till he take leave, and presently after him.

Sir To.

I will meditate the while upon some horrid message for a challenge.

[ Exeunt SIR TOBY, FABIAN, and MARIA.

Re-enter OLIVIA, with VIOLA.

Oli.

I have said too much unto a heart of stone,  Craig1916: 224

And laid mine honour too unchary out:

There’s something in me that reproves my fault,

But such a headstrong potent fault it is

That it but mocks reproof.  Craig1916: 228

Vio.

With the same haviour that your passion bears

Goes on my master’s griefs.

Oli.

Here; wear this jewel for me, ’tis my picture;

Refuse it not; it hath no tongue to vex you;  Craig1916: 232

And I beseech you come again to-morrow.

What shall you ask of me that I’ll deny,

That honour sav’d may upon asking give?

Vio.

Nothing but this; your true love for my master.  Craig1916: 236

Oli.

How with mine honour may I give him that

Which I have given to you?

Vio.

I will acquit you.

Oli.

Well, come again to-morrow: fare thee well:

A fiend like thee might bear my soul to hell.  Craig1916: 240

[ Exit.

Re-enter SIR TOBY BELCH and FABIAN.

Sir To.

Gentleman, God save thee.

Vio.

And you, sir.

Sir To.

That defence thou hast, betake thee to’t: of what nature the wrongs are thou hast done him, I know not; but thy intercepter, full of despite, bloody as the hunter, attends thee at the orchard-end. Dismount thy tuck, be yare in thy preparation, for thy assailant is quick, skilful, and deadly.  Craig1916: 249

Vio.

You mistake, sir: I am sure no man hath any quarrel to me: my remembrance is very free and clear from any image of offence done to any man.  Craig1916: 253

Sir To.

You’ll find it otherwise, I assure you: therefore, if you hold your life at any price, betake you to your guard; for your opposite hath in him what youth, strength, skill, and wrath, can furnish man withal.

Vio.

I pray you, sir, what is he?  Craig1916: 259

Sir To.

He is knight dubbed with unhatched rapier, and on carpet consideration; but he is a devil in private brawl: souls and bodies hath he divorced three, and his incensement at this moment is so implacable that satisfaction can be none but by pangs of death and sepulchre. Hob, nob, is his word: give’t or take’t.  Craig1916: 266

Vio.

I will return again into the house and desire some conduct of the lady: I am no fighter. I have heard of some kind of men that put quarrels purposely on others to taste their valour; belike this is a man of that quirk.

Sir To.

Sir, no; his indignation derives itself out of a very competent injury: therefore get you on and give him his desire. Back you shall not to the house, unless you undertake that with me which with as much safety you might answer him: therefore, on, or strip your sword stark naked; for meddle you must, that’s certain, or forswear to wear iron about you.  Craig1916: 279

Vio.

This is as uncivil as strange. I beseech you, do me this courteous office, as to know of the knight what my offence to him is: it is something of my negligence, nothing of my purpose.

Sir To.

I will do so. Signior Fabian, stay you by this gentleman till my return.

[ Exit.

Vio.

Pray you, sir, do you know of this matter?  Craig1916: 287

Fab.

I know the knight is incensed against you, even to a mortal arbitrement, but nothing of the circumstance more.

Vio.

I beseech you, what manner of man is he?  Craig1916: 292

Fab.

Nothing of that wonderful promise, to read him by his form, as you are like to find him in the proof of his valour. He is, indeed, sir, the most skilful, bloody, and fatal opposite that you could possibly have found in any part of Illyria. Will you walk towards him? I will make your peace with him if I can.  Craig1916: 299

Vio.

I shall be much bound to you for’t: I am one that had rather go with sir priest than sir knight; I care not who knows so much of my mettle.

[ Exeunt.

Re-enter SIR TOBY, with SIR ANDREW.

Sir To.

Why, man, he’s a very devil; I have not seen such a firago. I had a pass with him, rapier, scabbard and all, and he gives me the stuck in with such a mortal motion that it is inevitable; and on the answer, he pays you as surely as your feet hit the ground they step on. They say he has been fencer to the Sophy.  Craig1916: 310

Sir And.

Pox on’t, I’ll not meddle with him.

Sir To.

Ay, but he will not now be pacified: Fabian can scarce hold him yonder.  Craig1916: 313

Sir And.

Plague on’t; an I thought he had been valiant and so cunning in fence I’d have seen him damned ere I’d have challenged him. Let him let the matter slip, and I’ll give him my horse, grey Capilet.  Craig1916: 318

Sir To.

I’ll make the motion. Stand here; make a good show on’t: this shall end without the perdition of souls.— [ Aside. ] Marry, I’ll ride your horse as well as I ride you.

Re-enter FABIAN and VIOLA.

[ To FABIAN. ] I have his horse to take up the quarrel. I have persuaded him the youth’s a devil.  Craig1916: 325

Fab.

He is as horribly conceited of him; and pants and looks pale, as if a bear were at his heels.  Craig1916: 328

Sir To.

There’s no remedy, sir: he will fight with you for his oath’s sake. Marry, he hath better bethought him of his quarrel, and he finds that now scarce to be worth talking of: therefore draw for the supportance of his vow: he protests he will not hurt you.

Vio.

[ Aside. ] Pray God defend me! A little thing would make me tell them how much I lack of a man.  Craig1916: 337

Fab.

Give ground, if you see him furious.

Sir To.

Come, Sir Andrew, there’s no remedy: the gentleman will, for his honour’s sake, have one bout with you; he cannot by the duello avoid it: but he has promised me, as he is a gentleman and a soldier, he will not hurt you. Come on; to’t.  Craig1916: 344

Sir And.

Pray God, he keep his oath!

[ Draws.

Vio.

I do assure you, ’tis against my will.

[ Draws.

Enter ANTONIO.

Ant.

Put up your sword. If this young gentleman

Have done offence, I take the fault on me:  Craig1916: 348

If you offend him, I for him defy you.

[ Drawing.

Sir To.

You, sir! why, what are you?

Ant.

One, sir, that for his love dares yet do more

Than you have heard him brag to you he will.  Craig1916: 352

Sir To.

Nay, if you be an undertaker, I am for you.

[ Draws.

Fab.

O, good sir Toby, hold! here come the officers.  Craig1916: 356

Sir To.

I’ll be with you anon.

Vio.

[ To SIR ANDREW. ] Pray, sir, put your sword up, if you please.

Sir And.

Marry, will I, sir; and, for that I promised you, I’ll be as good as my word. He will bear you easily and reins well.

Enter two Officers.

First Off.

This is the man; do thy office.

Sec. Off.

Antonio, I arrest thee at the suit  Craig1916: 364

Of Count Orsino.

Ant.

You do mistake me, sir.

First Off.

No, sir, no jot: I know your favour well,

Though now you have no sea-cap on your head.

Take him away: he knows I know him well.  Craig1916: 368

Ant.

I must obey.— [ To VIOLA. ] This comes with seeking you:

But there’s no remedy: I shall answer it.

What will you do, now my necessity

Makes me to ask you for my purse? It grieves me

Much more for what I cannot do for you  Craig1916: 373

Than what befalls myself. You stand amaz’d:

But be of comfort.

Sec. Off.

Come, sir, away.

Ant.

I must entreat of you some of that money.

Vio.

What money, sir?

For the fair kindness you have show’d me here,

And part, being prompted by your present trouble,

Out of my lean and low ability  Craig1916: 380

I’ll lend you something: my having is not much:

I’ll make division of my present with you.

Hold, there is half my coffer.

Ant.

Will you deny me now?

Is’t possible that my deserts to you  Craig1916: 384

Can lack persuasion? Do not tempt my misery,

Lest that it make me so unsound a man

As to upbraid you with those kindnesses

That I have done for you.

Vio.

I know of none;  Craig1916: 388

Nor know I you by voice or any feature.

I hate ingratitude more in a man

Than lying, vainness, babbling drunkenness,

Or any taint of vice whose strong corruption  Craig1916: 392

Inhabits our frail blood.

Ant.

O heavens themselves!

Sec. Off.

Come, sir: I pray you, go.

Ant.

Let me speak a little. This youth that you see here

I snatch’d one-half out of the jaws of death,  Craig1916: 396

Reliev’d him with such sanctity of love,

And to his image, which methought did promise

Most venerable worth, did I devotion.

First Off.

What’s that to us? The time goes by: away!  Craig1916: 400

Ant.

But O! how vile an idol proves this god.

Thou hast, Sebastian, done good feature shame.

In nature there’s no blemish but the mind;

None can be call’d deform’d but the unkind:  Craig1916: 404

Virtue is beauty, but the beauteous evil

Are empty trunks o’erflourish’d by the devil.

First Off.

The man grows mad: away with him! Come, come, sir.

Ant.

Lead me on.  Craig1916: 408

[ Exeunt Officers with ANTONIO.

Vio.

Methinks his words do from such passion fly,

That he believes himself; so do not I.

Prove true, imagination, O, prove true,

That I, dear brother, be now ta’en for you!  Craig1916: 412

Sir To.

Come hither, knight; come hither,

Fabian: we’ll whisper o’er a couplet or two of most sage saws.

Vio.

He nam’d Sebastian: I my brother know

Yet living in my glass; even such and so  Craig1916: 417

In favour was my brother; and he went

Still in this fashion, colour, ornament,

For him I imitate. O! if it prove,  Craig1916: 420

Tempests are kind, and salt waves fresh in love!

[ Exit.

Sir To.

A very dishonest paltry boy, and more a coward than a hare. His dishonesty appears in leaving his friend here in necessity, and denying him; and for his cowardship, ask Fabian.  Craig1916: 425

Fab.

A coward, a most devout coward, religious in it.

Sir And.

’Slid, I’ll after him again and beat him.  Craig1916: 429

Sir To.

Do; cuff him soundly, but never draw thy sword.

Sir And.

An I do not,—

[ Exit.

Fab.

Come, let’s see the event.  Craig1916: 433

Sir To.

I dare lay any money ’twill be nothing yet.

[ Exeunt.

ACT IV.

SCENE I.—: The Street adjoining OLIVIA’S House.

Enter SEBASTIAN and Clown.

Clo.

Will you make me believe that I am not sent for you?

Seb.

Go to, go to; thou art a foolish fellow:

Let me be clear of thee.  Craig1916: 4

Clo.

Well held out, i’ faith! No, I do not know you; nor I am not sent to you by my lady to bid you come speak with her; nor your name is not Master Cesario; nor this is not my nose neither. Nothing that is so is so.  Craig1916: 9

Seb.

I prithee, vent thy folly somewhere else:

Thou know’st not me.

Clo.

Vent my folly! He has heard that word of some great man, and now applies it to a fool. Vent my folly! I am afraid this great lubber, the world, will prove a cockney. I prithee now, ungird thy strangeness and tell me what I shall vent to my lady. Shall I vent to her that thou art coming?

Seb.

I prithee, foolish Greek, depart from me:

There’s money for thee: if you tarry longer  Craig1916: 20

I shall give worse payment.

Clo.

By my troth, thou hast an open hand.

These wise men that give fools money get themselves a good report after fourteen years’ purchase.  Craig1916: 25

Enter SIR ANDREW.

Sir And.

Now, sir, have I met you again? there’s for you.

[ Striking SEBASTIAN.

Seb.

Why, there’s for thee, and there, and there, and there!

[ Beating SIR ANDREW.

Are all the people mad?  Craig1916: 29

Enter SIR TOBY and FABIAN.

Sir To.

Hold, sir, or I’ll throw your dagger o’er the house.

Clo.

This will I tell my lady straight. I would not be in some of your coats for twopence.

[ Exit.

Sir To.

[ Holding SEBASTIAN. ] Come on, sir: hold.  Craig1916: 35

Sir And.

Nay, let him alone; I’ll go another way to work with him: I’ll have an action of battery against him if there be any law in Illyria. Though I struck him first, yet it’s no matter for that.  Craig1916: 40

Seb.

Let go thy hand.

Sir To.

Come, sir, I will not let you go. Come, my young soldier, put up your iron: you are well fleshed; come on.  Craig1916: 44

Seb.

I will be free from thee. [ Disengaging himself. ] What wouldst thou now?

If thou dar’st tempt me further, draw thy sword.

Sir To.

What, what! Nay then, I must have an ounce or two of this malapert blood from you.

[ Draws.

Enter OLIVIA.

Oli.

Hold, Toby! on thy life I charge thee, hold!  Craig1916: 49

Sir To.

Madam!

Oli.

Will it be ever thus? Ungracious wretch!

Fit for the mountains and the barbarous caves,

Where manners ne’er were preach’d. Out of my sight!  Craig1916: 53

Be not offended, dear Cesario.

Rudesby, be gone!

[ Exeunt SIR TOBY, SIR ANDREW, and FABIAN.

I prithee, gentle friend,

Let thy fair wisdom, not thy passion, sway  Craig1916: 56

In this uncivil and unjust extent

Against thy peace. Go with me to my house,

And hear thou there how many fruitless pranks

This ruffian hath botch’d up, that thou thereby

Mayst smile at this. Thou shalt not choose but go:  Craig1916: 61

Do not deny. Beshrew his soul for me,

He started one poor heart of mine in thee.

Seb.

What relish is in this? how runs the stream?  Craig1916: 64

Or I am mad, or else this is a dream:

Let fancy still my sense in Lethe steep;

If it be thus to dream, still let me sleep!

Oli.

Nay; come, I prithee. Would thou’dst be rul’d by me!  Craig1916: 68

Seb.

Madam, I will.

Oli.

O! say so, and so be!

[ Exeunt.

SCENE II.—: A Room in OLIVIA’S House.

Enter MARIA and Clown; MALVOLIO in a dark chamber adjoining.

Mar.

Nay, I prithee, put on this gown and this beard; make him believe thou art Sir Topas the curate: do it quickly; I’ll call Sir Toby the whilst.

[ Exit.

Clo.

Well, I’ll put it on and I will dissemble myself in’t: and I would I were the first that ever dissembled in such a gown. I am not tall enough to become the function well, nor lean enough to be thought a good student; but to be said an honest man and a good housekeeper goes as fairly as to say a careful man and a great scholar. The competitors enter.  Craig1916: 12

Enter SIR TOBY BELCH and MARIA.

Sir To.

God bless thee, Master parson.

Clo.

Bonos dies, Sir Toby: for, as the old hermit of Prague, that never saw pen and ink, very wittily said to a niece of King Gorboduc, ‘That, that is, is;’ so I, being Master parson, am Master parson; for, what is ‘that,’ but ‘that,’ and ‘is,’ but ‘is?’

Sir To.

To him, Sir Topas.  Craig1916: 20

Clo.

What ho! I say. Peace in this prison!

Sir To.

The knave counterfeits well; a good knave.

Mal.

[ Within ]. Who calls there?  Craig1916: 24

Clo.

Sir Topas, the curate, who comes to visit Malvolio the lunatic.

Mal.

Sir Topas, Sir Topas, good Sir Topas, go to my lady.  Craig1916: 28

Clo.

Out, hyperbolical fiend! how vexest thou this man! Talkest thou nothing but of ladies?

Sir To.

Well said, Master Parson.

Mal.

[ Within. ] Sir Topas, never was man thus wronged. Good Sir Topas, do not think I am mad: they have laid me here in hideous darkness.  Craig1916: 35

Clo.

Fie, thou dishonest Satan! I call thee by the most modest terms; for I am one of those gentle ones that will use the devil himself with courtesy. Sayst thou that house is dark?

Mal.

As hell, Sir Topas.  Craig1916: 40

Clo.

Why, it hath bay-windows transparent as barricadoes, and the clerestories toward the south-north are as lustrous as ebony; and yet complainest thou of obstruction?  Craig1916: 44

Mal.

I am not mad, Sir Topas. I say to you, this house is dark.

Clo.

Madman, thou errest: I say, there is no darkness but ignorance, in which thou art more puzzled than the Egyptians in their fog.  Craig1916: 49

Mal.

I say this house is as dark as ignorance, though ignorance were as dark as hell; and I say, there was never man thus abused. I am no more mad than you are: make the trial of it in any constant question.

Clo.

What is the opinion of Pythagoras concerning wild fowl?  Craig1916: 56

Mal.

That the soul of our grandam might haply inhabit a bird.

Clo.

What thinkest thou of his opinion?

Mal.

I think nobly of the soul, and no way approve his opinion.  Craig1916: 61

Clo.

Fare thee well: remain thou still in darkness: thou shalt hold the opinion of Pythagoras ere I will allow of thy wits, and fear to kill a woodcock, lest thou dispossess the soul of thy grandam. Fare thee well.

Mal.

Sir Topas! Sir Topas!

Sir To.

My most exquisite Sir Topas!  Craig1916: 68

Clo.

Nay, I am for all waters.

Mar.

Thou mightst have done this without thy beard and gown: he sees thee not.

Sir To.

To him in thine own voice, and bring me word how thou findest him: I would we were well rid of this knavery. If he may be conveniently delivered, I would he were; for I am now so far in offence with my niece that I cannot pursue with any safety this sport to the upshot. Come by and by to my chamber.

[ Exeunt SIR TOBY and MARIA.

Clo.

- Hey Robin, jolly Robin,

- Tell me how thy lady does.  Craig1916: 80

Mal.

Fool!

Clo.

My lady is unkind, perdy!

Mal.

Fool!

Clo.

Alas, why is she so?  Craig1916: 84

Mal.

Fool, I say!

Clo.

She loves another.

Who calls, ha?

Mal.

Good fool, as ever thou wilt deserve well at my hand, help me to a candle, and pen, ink, and paper. As I am a gentleman, I will live to be thankful to thee for’t.

Clo.

Master Malvoliol  Craig1916: 92

Mal.

Ay, good fool.

Clo.

Alas, sir, how fell you beside your five wits?

Mal.

Fool, there was never man so notoriously abused: I am as well in my wits, fool, as thou art.

Clo.

But as well? then you are mad indeed, if you be no better in your wits than a fool.  Craig1916: 100

Mal.

They have here propertied me; keep me in darkness, send ministers to me, asses! and do all they can to face me out of my wits.

Clo.

Advise you what you say: the minister is here. Malvolio, Malvolio, thy wits the heavens restore! endeavour thyself to sleep, and leave thy vain bibble-babble.

Mal.

Sir Topas!  Craig1916: 108

Clo.

Maintain no words with him, good fellow.—Who, I, sir? not I, sir. God be wi’ you, good Sir Topas. Marry, amen. I will, sir, I will.  Craig1916: 112

Mal.

Fool, fool, fool, I say!

Clo.

Alas, sir, be patient. What say you, sir? I am shent for speaking to you.

Mal.

Good fool, help me to some light and some paper: I tell thee I am as well in my wits as any man in Illyria.

Clo.

Well-a-day, that you were, sir!  Craig1916: 119

Mal.

By this hand, I am. Good fool, some ink, paper, and light; and convey what I will set down to my lady: it shall advantage thee more than ever the bearing of letter did.  Craig1916: 123

Clo.

I will help you to’t. But tell me true, are you not mad indeed? or do you but counterfeit?

Mal.

Believe me, I am not: I tell thee true.  Craig1916: 128

Clo.

Nay, I’ll ne’er believe a madman till I see his brains. I will fetch you light and paper and ink.

Mal.

Fool, I’ll requite it in the highest degree: I prithee, be gone.  Craig1916: 133

Clo.

- I am gone, sir,

- And anon, sir,

- I’ll be with you again  Craig1916: 136

- In a trice,

- Like to the old Vice,

- Your need to sustain;

- Who with dagger of lath,  Craig1916: 140

- In his rage and his wrath,

- Cries, Ah, ah! to the devil:

- Like a mad lad,

- Pare thy nails, dad;  Craig1916: 144

- Adieu, goodman drivel.

- [ Exit.

SCENE III.—: OLIVIA’S Garden.

Enter SEBASTIAN.

Seb.

This is the air; that is the glorious sun; This pearl she gave me, I do feel’t and see’t;

And though ’tis wonder that enwraps me thus,

Yet ’tis not madness. Where’s Antonio then?

I could not find him at the Elephant;  Craig1916: 5

Yet there he was, and there I found this credit,

That he did range the town to seek me out.

His counsel now might do me golden service;  Craig1916: 8

For though my soul disputes well with my sense

That this may be some error, but no madness,

Yet doth this accident and flood of fortune

So far exceed all instance, all discourse,  Craig1916: 12

That I am ready to distrust mine eyes,

And wrangle with my reason that persuades me

To any other trust but that I am mad

Or else the lady’s mad: yet, if ’twere so,  Craig1916: 16

She could not sway her house, command her followers,

Take and give back affairs and their dispatch

With such a smooth, discreet, and stable bearing

As I perceive she does. There’s something in’t

That is deceivable. But here the lady comes.  Craig1916: 21

Enter OLIVIA and a Priest.

Oli.

Blame not this haste of mine. If you mean well,

Now go with me and with this holy man

Into the chantry by; there, before him,  Craig1916: 24

And underneath that consecrated roof,

Plight me the full assurance of your faith;

That my most jealous and too doubtful soul

May live at peace. He shall conceal it  Craig1916: 28

Whiles you are willing it shall come to note,

What time we will our celebration keep

According to my birth. What do you say?

Seb.

I’ll follow this good man, and go with you;  Craig1916: 32

And, having sworn truth, ever will be true.

Oli.

Then lead the way, good father; and heavens so shine

That they may fairly note this act of mine!

[ Exeunt.

ACT V.

SCENE I.—: The Street before OLIVIA’S House. Enter Clown and FABIAN.

Fab.

Now, as thou lovest me, let me see his letter.

Clo.

Good Master Fabian, grant me another request.  Craig1916: 4

Fab.

Anything.

Clo.

Do not desire to see this letter.

Fab.

This is, to give a dog, and, in recompense desire my dog again.  Craig1916: 8

Enter DUKE, VIOLA, CURIO, and Attendants.

Duke.

Belong you to the Lady Olivia, friends?

Clo.

Ay, sir; we are some of her trappings.

Duke.

I know thee well: how dost thou, my good fellow?  Craig1916: 12

Clo.

Truly, sir, the better for my foes and the worse for my friends.

Duke.

Just the contrary; the better for thy friends.  Craig1916: 16

Clo.

No, sir, the worse.

Duke.

How can that be?

Clo.

Marry, sir, they praise me and make an ass of me; now my foes tell me plainly I am an ass: so that by my foes, sir, I profit in the knowledge of myself, and by my friends I am abused: so that, conclusions to be as kisses, if your four negatives make your two affirmatives, why then, the worse for my friends and the better for my foes.  Craig1916: 26

Duke.

Why, this is excellent.

Clo.

By my troth, sir, no; though it please you to be one of my friends.

Duke.

Thou shalt not be the worse for me: there’s gold.

Clo.

But that it would be double-dealing, sir, I would you could make it another.  Craig1916: 33

Duke.

O, you give me ill counsel.

Clo.

Put your grace in your pocket, sir, for this once, and let your flesh and blood obey it.  Craig1916: 36

Duke.

Well, I will be so much a sinner to be a double-dealer: there’s another.

Clo.

Primo, secundo, tertio, is a good play; and the old saying is, ‘the third pays for all:’ the triplex, sir, is a good tripping measure; or the bells of Saint Bennet, sir, may put you in mind; one, two, three.  Craig1916: 43

Duke.

You can fool no more money out of me at this throw: if you will let your lady know I am here to speak with her, and bring her along with you, it may awake my bounty further.  Craig1916: 47

Clo.

Marry, sir, lullaby to your bounty till I come again. I go, sir; but I would not have you to think that my desire of having is the sin of covetousness; but as you say, sir, let your bounty take a nap, I will awake it anon.

[ Exit.

Vio.

Here comes the man, sir, that did rescue me.

Enter ANTONIO and Officers.

Duke.

That face of his I do remember well;

Yet when I saw it last, it was besmear’d  Craig1916: 56

As black as Vulcan in the smoke of war.

A bawbling vessel was he captain of,

For shallow draught and hulk unprizable;

With which such scathful grapple did he make

With the most noble bottom of our fleet,  Craig1916: 61

That very envy and the tongue of loss

Cried fame and honour on him. What’s the matter?

First Off.

Orsino, this is that Antonio  Craig1916: 64

That took the Phœnix and her fraught from Candy;

And this is he that did the Tiger board,

When your young nephew Titus lost his leg.

Here in the streets, desperate of shame and state,  Craig1916: 68

In private brabble did we apprehend him.

Vio.

He did me kindness, sir, drew on my side;

But in conclusion put strange speech upon me:

I know not what ’twas but distraction.  Craig1916: 72

Duke.

Notable pirate! thou salt-water thief!

What foolish boldness brought thee to their mercies

Whom thou, in terms so bloody and so dear,

Hast made thine enemies?

Ant.

Orsino, noble sir,  Craig1916: 76

Be pleas’d that I shake off these names you give me:

Antonio never yet was thief or pirate,

Though I confess, on base and ground enough,

Orsino’s enemy. A witchcraft drew me hither:

That most ingrateful boy there by your side,  Craig1916: 81

From the rude sea’s enrag’d and foamy mouth

Did I redeem; a wrack past hope he was:

His life I gave him, and did thereto add  Craig1916: 84

My love, without retention or restraint,

All his in dedication; for his sake

Did I expose myself, pure for his love,

Into the danger of this adverse town;  Craig1916: 88

Drew to defend him when he was beset:

Where being apprehended, his false cunning,

Not meaning to partake with me in danger,

Taught him to face me out of his acquaintance,  Craig1916: 92

And grew a twenty years removed thing

While one would wink, denied me mine own purse,

Which I had recommended to his use

Not half an hour before.

Vio.

How can this be?  Craig1916: 96

Duke.

When came he to this town?

Ant.

To-day, my lord; and for three months before,—

No interim, not a minute’s vacancy,—

Both day and night did we keep company.  Craig1916: 100

Enter OLIVIA and Attendants.

Duke.

Here comes the countess: now heaven walks on earth!

But for thee, fellow; fellow, thy words are madness:

Three months this youth hath tended upon me;

But more of that anon. Take him aside.  Craig1916: 104

Oli.

What would my lord, but that he may not have,

Wherein Olivia may seem serviceable?

Cesario, you do not keep promise with me.

Vio.

Madam!  Craig1916: 108

Duke.

Gracious Olivia.—

Oli.

What do you say, Cesario? Good my lord,—

Vio.

My lord would speak; my duty hushes me.

Oli.

If it be aught to the old tune, my lord,

It is as fat and fulsome to mine ear  Craig1916: 113

As howling after music.

Duke.

Still so cruel?

Oli.

Still so constant, lord.

Duke.

What, to perverseness? you uncivil lady,  Craig1916: 116

To whose ingrate and unauspicious altars

My soul the faithfull’st offerings hath breath’d out

That e’er devotion tender’d! What shall I do?

Oli.

Even what it please my lord, that shall become him.  Craig1916: 120

Duke.

Why should I not, had I the heart to do it,

Like to the Egyptian thief at point of death,

Kill what I love? a savage jealousy

That sometimes savours nobly. But hear me this:  Craig1916: 124

Since you to non-regardance cast my faith,

And that I partly know the instrument

That screws me from my true place in your favour,

Live you, the marble-breasted tyrant still;  Craig1916: 128

But this your minion, whom I know you love,

And whom, by heaven I swear, I tender dearly,

Him will I tear out of that cruel eye,

Where he sits crowned in his master’s spite.  Craig1916: 132

Come, boy, with me; my thoughts are ripe in mischief;

I’ll sacrifice the lamb that I do love,

To spite a raven’s heart within a dove.

[ Going.

Vio.

And I, most jocund, apt, and willingly,

To do you rest, a thousand deaths would die.  Craig1916: 137

[ Following.

Oli.

Where goes Cesario?

Vio.

After him I love

More than I love these eyes, more than my life,

More, by all mores, than e’er I shall love wife.  Craig1916: 140

If I do feign, you witnesses above

Punish my life for tainting of my love!

Oli.

Ah me, detested! how am I beguil’d!

Vio.

Who does beguile you? who does do you wrong?  Craig1916: 144

Oli.

Hast thou forgot thyself? Is it so long?

Call forth the holy father.

[ Exit an Attendant.

Duke.

[ To VIOLA. ] Come away.

Oli.

Whither, my lord? Cesario, husband, stay.

Duke.

Husband?

Oli.

Ay, husband: can he that deny?  Craig1916: 148

Duke.

Her husband, sirrah?

Vio.

No, my lord, not I.

Oli.

Alas! it is the baseness of thy fear

That makes thee strangle thy propriety.

Fear not, Cesario; take thy fortunes up;  Craig1916: 152

Be that thou know’st thou art, and then thou art

As great as that thou fear’st.

Enter Priest.

O, welcome, father!

Father, I charge thee, by thy reverence,

Here to unfold,—though lately we intended  Craig1916: 156

To keep in darkness what occasion now

Reveals before ’tis ripe,—what thou dost know

Hath newly pass’d between this youth and me.

Priest.

A contract of eternal bond of love,  Craig1916: 160

Confirm’d by mutual joinder of your hands,

Attested by the holy close of lips,

Strengthen’d by interchangement of your rings;

And all the ceremony of this compact  Craig1916: 164

Seal’d in my function, by my testimony:

Since when, my watch hath told me, toward my grave

I have travell’d but two hours.

Duke.

O, thou dissembling cub! what wilt thou be  Craig1916: 168

When time hath sow’d a grizzle on thy case?

Or will not else thy craft so quickly grow

That thine own trip shall be thine overthrow?

Farewell, and take her; but direct thy feet  Craig1916: 172

Where thou and I henceforth may never meet.

Vio.

My lord, I do protest,—

Oli.

O! do not swear:

Hold little faith, though thou hast too much fear.

Enter SIR ANDREW AGUECHEEK, with his head broken.

Sir And.

For the love of God, a surgeon! send one presently to Sir Toby.  Craig1916: 177

Oli.

What’s the matter?

Sir And.

He has broke my head across, and has given Sir Toby a bloody coxcomb too. For the love of God, your help! I had rather than forty pound I were at home.  Craig1916: 182

Oli.

Who has done this, Sir Andrew?

Sir And.

The count’s gentleman, one Cesario: we took him for a coward, but he’s the very devil incardinate.  Craig1916: 186

Duke.

My gentleman, Cesario?

Sir And.

Od’s lifelings! here he is. You broke my head for nothing! and that that I did, I was set on to do’t by Sir Toby.

Vio.

Why do you speak to me? I never hurt you:

You drew your sword upon me without cause;

But I bespake you fair, and hurt you not.  Craig1916: 193

Sir And.

If a bloody coxcomb be a hurt, you have hurt me: I think you set nothing by a bloody coxcomb. Here comes Sir Toby halting;  Craig1916: 197

Enter SIR TOBY BELCH, drunk, led by the Clown.

you shall hear more: but if he had not been in drink he would have tickled you othergates than he did.  Craig1916: 200

Duke.

How now, gentleman! how is’t with you?

Sir To.

That’s all one: he has hurt me, and there’s the end on’t. Sot, didst see Dick surgeon, sot?  Craig1916: 205

Clo.

O! he’s drunk, Sir Toby, an hour agone: his eyes were set at eight i’ the morning.

Sir To.

Then he’s a rogue, and a passy-measures pavin. I hate a drunken rogue.  Craig1916: 209

Oli.

Away with him! Who hath made this havoc with them?

Sir And.

I’ll help you, Sir Toby, because we’ll be dressed together.  Craig1916: 213

Sir To.

Will you help? an ass-head and a coxcomb and a knave, a thin-faced knave, a gull!  Craig1916: 216

Oli.

Get him to bed, and let his hurt be look’d to.

[ Exeunt Clown, FABIAN, SIR TOBY, and SIR ANDREW.

Enter SEBASTIAN.

Seb.

I am sorry, madam, I have hurt your kinsman;

But, had it been the brother of my blood,  Craig1916: 220

I must have done no less with wit and safety.

You throw a strange regard upon me, and by that

I do perceive it hath offended you:

Pardon me, sweet one, even for the vows  Craig1916: 224

We made each other but so late ago.

Duke.

One face, one voice, one habit, and two persons;

A natural perspective, that is, and is not!

Seb.

Antonio! O my dear Antonio!  Craig1916: 228

How have the hours rack’d and tortur’d me

Since I have lost thee!

Ant.

Sebastian are you?

Seb.

Fear’st thou that, Antonio?

Ant.

How have you made division of yourself?  Craig1916: 232

An apple cleft in two is not more twin

Than these two creatures. Which is Sebastian?

Oli.

Most wonderful!

Seb.

Do I stand there? I never had a brother;  Craig1916: 236

Nor can there be that deity in my nature,

Of here and every where. I had a sister,

Whom the blind waves and surges have devour’d.

Of charity, what kin are you to me?  Craig1916: 240

What countryman? what name? what parentage?

Vio.

Of Messaline: Sebastian was my father;

Such a Sebastian was my brother too,

So went he suited to his watery tomb.  Craig1916: 244

If spirits can assume both form and suit

You come to fright us.

Seb.

A spirit I am indeed;

But am in that dimension grossly clad

Which from the womb I did participate.  Craig1916: 248

Were you a woman, as the rest goes even,

I should my tears let fall upon your cheek,

And say, ‘Thrice welcome, drowned Viola!’

Vio.

My father had a mole upon his brow.

Seb.

And so had mine.  Craig1916: 253

Vio.

And died that day when Viola from her birth

Had number’d thirteen years.

Seb.

O! that record is lively in my soul.  Craig1916: 256

He finished indeed his mortal act

That day that made my sister thirteen years.

Vio.

If nothing lets to make us happy both

But this my masculine usurp’d attire,  Craig1916: 260

Do not embrace me till each circumstance

Of place, time, fortune, do cohere and jump

That I am Viola: which to confirm,

I’ll bring you to a captain in this town,  Craig1916: 264

Where lie my maiden weeds: by whose gentle help

I was preserv’d to serve this noble count.

All the occurrence of my fortune since

Hath been between this lady and this lord.  Craig1916: 268

Seb.

[ To OLIVIA. ] So comes it, lady, you have been mistook:

But nature to her bias drew in that.

You would have been contracted to a maid;

Nor are you therein, by my life, deceiv’d,  Craig1916: 272

You are betroth’d both to a maid and man.

Duke.

Be not amaz’d; right noble is his blood.

If this be so, as yet the glass seems true,

I shall have share in this most happy wrack.

[ To VIOLA. ] Boy, thou hast said to me a thousand times  Craig1916: 277

Thou never shouldst love woman like to me.

Vio.

And all those sayings will I over-swear,

And all those swearings keep as true in soul  Craig1916: 280

As doth that orbed continent the fire

That severs day from night.

Duke.

Give me thy hand;

And let me see thee in thy woman’s weeds.

Vio.

The captain that did bring me first on shore  Craig1916: 284

Hath my maid’s garments: he upon some action

Is now in durance at Malvolio’s suit,

A gentleman and follower of my lady’s.

Oli.

He shall enlarge him. Fetch Malvolio hither.  Craig1916: 288

And yet, alas, now I remember me,

They say, poor gentleman, he’s much distract.

A most extracting frenzy of mine own

From my remembrance clearly banish’d his.  Craig1916: 292

Re-enter Clown with a letter, and FABIAN.

How does he, sirrah?

Clo.

Truly, madam, he holds Belzebub at the stave’s end as well as a man in his case may do. He has here writ a letter to you: I should have given it to you to-day morning; but as a madman’s epistles are no gospels, so it skills not much when they are delivered.

Oli.

Open it, and read it.  Craig1916: 300

Clo.

Look then to be well edified, when the fool delivers the madman.

By the Lord, madam, —

Oli.

How now! art thou mad?  Craig1916: 304

Clo.

No, madam, I do but read madness: an your ladyship will have it as it ought to be, you must allow vox.

Oli.

Prithee, read i’ thy right wits.  Craig1916: 308

Clo.

So I do, madonna; but to read his right wits is to read thus: therefore perpend, my princess, and give ear.

Oli.

[ To FABIAN. ] Read it you, sirrah.  Craig1916: 312

Fab.

By the Lord, madam, you wrong me, and the world shall know it: though you have put me into darkness, and given your drunken cousin rule over me, yet have I the benefit of my senses as well as your ladyship. I have your own letter that induced me to the semblance I put on; with the which I doubt not but to do myself much right, or you much shame. Think of me as you please. I leave my duty a little unthought of, and speak out of my injury.

THE MADLY-USED MALVOLIO.

Oli.

Did he write this?  Craig1916: 324

Clo.

Ay, madam.

Duke.

This savours not much of distraction.

Oli.

See him deliver’d, Fabian; bring him hither.

[ Exit FABIAN.

My lord, so please you, these things further thought on,  Craig1916: 328

To think me as well a sister as a wife,

One day shall crown the alliance on’t, so please you,

Here at my house and at my proper cost.

Duke.

Madam, I am most apt to embrace your offer.  Craig1916: 332

[ To VIOLA. ] Your master quits you; and, for your service done him,

So much against the mettle of your sex,

So far beneath your soft and tender breeding;

And since you call’d me master for so long,  Craig1916: 336

Here is my hand: you shall from this time be

Your master’s mistress.

Oli.

A sister! you are she.

Re-enter FABIAN, with MALVOLIO.

Duke.

Is this the madman?

Oli.

Ay, my lord, this same.

How now, Malvolio!

Mal.

Madam, you have done me wrong,

Notorious wrong.

Oli.

Have I, Malvolio? no.  Craig1916: 341

Mal.

Lady, you have. Pray you peruse that letter.

You must not now deny it is your hand:

Write from it, if you can, in hand or phrase,

Or say ’tis not your seal nor your invention:  Craig1916: 345

You can say none of this. Well, grant it then,

And tell me, in the modesty of honour,

Why you have given me such clear lights of favour,  Craig1916: 348

Bade me come smiling and cross-garter’d to you,

To put on yellow stockings, and to frown

Upon Sir Toby and the lighter people;

And, acting this in an obedient hope,  Craig1916: 352

Why have you suffer’d me to be imprison’d,

Kept in a dark house, visited by the priest,

And made the most notorious geck and gull

That e’er invention play’d on? tell me why.  Craig1916: 356

Oli.

Alas! Malvolio, this is not my writing,

Though, I confess, much like the character;

But, out of question, ’tis Maria’s hand:

And now I do bethink me, it was she  Craig1916: 360

First told me thou wast mad; then cam’st in smiling,

And in such forms which here were presuppos’d

Upon thee in the letter. Prithee, be content:

This practice hath most shrewdly pass’d upon thee;  Craig1916: 364

But when we know the grounds and authors of it,

Thou shalt be both the plaintiff and the judge

Of thine own cause.

Fab.

Good madam, hear me speak,

And let no quarrel nor no brawl to come  Craig1916: 368

Taint the condition of this present hour,

Which I have wonder’d at. In hope it shall not,

Most freely I confess, myself and Toby

Set this device against Malvolio here,  Craig1916: 372

Upon some stubborn and uncourteous parts

We had conceiv’d against him. Maria writ

The letter at Sir Toby’s great importance;

In recompense whereof he hath married her.

How with a sportful malice it was follow’d,  Craig1916: 377

May rather pluck on laughter than revenge,

If that the injuries be justly weigh’d

That have on both sides past.  Craig1916: 380

Oli.

Alas, poor fool, how have they baffled thee!

Clo.

Why, ‘some are born great, some achieve greatness, and some have greatness thrown upon them.’ I was one, sir, in this interlude; one Sir Topas, sir; but that’s all one. ‘By the Lord, fool, I am not mad:’ But do you remember? ‘Madam, why laugh you at such a barren rascal? an you smile not, he’s gagged:’ and thus the whirligig of time brings in his revenges.  Craig1916: 389

Mal.

I’ll be reveng’d on the whole pack of you.

[ Exit.

Oli.

He hath been most notoriously abus’d.

Duke.

Pursue him, and entreat him to a peace;—  Craig1916: 392

He hath not told us of the captain yet:

When that is known and golden time convents,

A solemn combination shall be made

Of our dear souls. Meantime, sweet sister,  Craig1916: 396

We will not part from hence. Cesario, come;

For so you shall be, while you are a man;

But when in other habits you are seen,

Orsino’s mistress, and his fancy’s queen.  Craig1916: 400

[ Exeunt all except Clown.

SONG.

Clo.

- When that I was and a little tiny boy,

- With hey, ho, the wind and the rain;

- A foolish thing was but a toy,

- For the rain it raineth every day.  Craig1916: 404

- But when I came to man’s estate,

- With hey, ho, the wind and the rain;

- ’Gainst knaves and thieves men shut their gates,

- For the rain it raineth every day.  Craig1916: 408

- But when I came, alas! to wive,

- With hey, ho, the wind and the rain;

- By swaggering could I never thrive,

- For the rain it raineth every day.  Craig1916: 412

- But when I came unto my beds,

- With hey, ho, the wind and the rain;

- With toss-pots still had drunken heads,

- For the rain it raineth every day.  Craig1916: 416

- A great while ago the world begun,

- With hey, ho, the wind and the rain;

- But that’s all one, our play is done,

- And we’ll strive to please you every day.

- [ Exit.

Table of Contents

About Liberty Fund

About The Online Library of Liberty

Copyright and Fair Use

TWELFTH-NIGHT; OR, WHAT YOU WILL

DRAMATIS PERSONÆ.

ACT I.

Scene I.—: A Room in the Duke’s Palace. Enter Duke, Curio, Lords; Musicians attending.

Scene II.—: The Sea-coast.

Scene III.—: A Room in Olivia’s House.

Scene IV.—: A Room in the Duke’s Palace.

Scene V.—: A Room in Olivia’s House.

ACT II.

Scene I.—: The Sea-coast.

Scene II.—: A Street.

Scene III.—: A Room in Olivia’s House.

Scene IV.—: A Room in the Duke’s Palace.

Scene V.—: Olivia’s Garden.

ACT III.

Scene I.—: Olivia’s Garden.

Scene II.—: A Room in Olivia’s House.

Scene III.—: A Street.

Scene IV.—: Olivia’s Garden.

ACT IV.

Scene I.—: The Street adjoining Olivia’s House.

Scene II.—: A Room in Olivia’s House.

Scene III.—: Olivia’s Garden.

ACT V.

Scene I.—: The Street before Olivia’s House. Enter Clown and Fabian.